%Filename: ot1miih.fd
%Created by: tex miih-drv
%Created using fontinst v1.933

%THIS FILE SHOULD BE PUT IN A TEX INPUTS DIRECTORY

\ProvidesFile{ot1miih.fd}
   [2012/08/14 Fontinst v1.933 font definitions for OT1/miih.]

\expandafter\ifx\csname MIIH@scale\endcsname\relax
 \let\MIIH@@scale\@empty
\else
 \edef\MIIH@@scale{s*[\csname MIIH@scale\endcsname]}%
\fi%

\DeclareFontFamily{OT1}{miih}{}

\DeclareFontShape{OT1}{miih}{m}{n}{
    <->\MIIH@@scale miih7t
}{}


\endinput
