%%
%% This is file `eqalone.def',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% eqexam.dtx  (with options: `copyright,standalone')
%% 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% eqexam.sty package,                                  %%
%% Copyright (C) 2005--2018  D. P. Story                %%
%%   dpstory@uakron.edu                                 %%
%%                                                      %%
%% This program can redistributed and/or modified under %%
%% the terms of the LaTeX Project Public License        %%
%% Distributed from CTAN archives in directory          %%
%% macros/latex/base/lppl.txt; either version 1.2 of    %%
%% the License, or (at your option) any later version.  %%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\ProvidesFile{eqalone.def}
 [2012/25/01 v3.0t Minimal code used by eqexam (dps)]
\@ifundefined{eq@tmpbox}{\newsavebox{\eq@tmpbox}}{}% defined in eforms
\@ifundefined{eq@tmpdima}{\newdimen\eq@tmpdima}{}  % defined in eforms
\def\RadioFieldSize{11bp}
\newdimen\eqcenterWidget
\def\centerWidget
#1{%
    \eqcenterWidget=#1
    \eqcenterWidget=.5\eqcenterWidget
    \advance\eqcenterWidget by-4bp
}
\def\eqe@BboxRect#1#2{\hbox{\ckbox@Color\vbox{\hrule width #1
  \hbox to#1{\vrule height#2\hfill\vrule height#2}\vfill\hrule}}}
\def\useRectForMC{\let\Bbox\eqe@BboxRect}
\def\selectedMC{\useRectForMC}
\def\Rect#1{\textcolor{\@linkcolor}{#1}}
\def\eqe@striphbox\mbox#1{#1}
\newcommand{\ReturnTo}[2]{\eq@fititin{\eqe@striphbox#2}}
\newcommand{\proofingsymbol}[1]{%
    \def\@proofingsymbol{\textcolor{\@proofingsymbolColor}{#1}}}
\endinput
%%
%% End of file `eqalone.def'.
