From 001d2f268370febe53928de6bd985ed75ee4b68c Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Tue, 23 Feb 2021 14:50:58 +0900
Subject: acrotex update

---
 texmf-dist/doc/latex/acrotex/examples/test_install.tex | 13 +++++++++----
 1 file changed, 9 insertions(+), 4 deletions(-)

(limited to 'texmf-dist/doc/latex/acrotex/examples/test_install.tex')

diff --git a/texmf-dist/doc/latex/acrotex/examples/test_install.tex b/texmf-dist/doc/latex/acrotex/examples/test_install.tex
index f804b9c8..b501c928 100644
--- a/texmf-dist/doc/latex/acrotex/examples/test_install.tex
+++ b/texmf-dist/doc/latex/acrotex/examples/test_install.tex
@@ -26,13 +26,18 @@ To test the \textsf{AeB} installation, press this button:
 
 Upon pressing the button, if you have installed the \texttt{aeb.js} file
 correctly, a congratulatory message appears in the console window; if the
-installation is not correct, a message informs you so. On failure, did you
-close \textsf{Acrobat} before opening this file? (The JS files are only read
-once when the \textsf{Acrobat} application is opened.) When all else fails,
-try rereading the installation instructions again
+installation is not correct, a message informs you so.
+
+On failure, did you close \textsf{Acrobat} before opening this file? (The JS
+files are only read once when the \textsf{Acrobat} application is opened.)
+When all else fails, try rereading the installation instructions again
 (\texttt{install\_jsfiles.pdf}), found in the \texttt{doc} folder, but more
 carefully this time.
 
+Still failing? Do you have \textsf{Acrobat DC}? Perhaps your \textsf{Acrobat}
+needs to be configured. Try reading \texttt{acrobat-in-workflow.pdf}, found
+in the \texttt{doc} folder.
+
 
 
 \end{document}
-- 
cgit v1.2.3

