% GP -> TeX interface file.  GPversion 3.83b
%
\def\PictureFile{spec.lp3}%
\def\PictureWidth{140.0}%
\def\PictureHeight{100.0}%
\def\PictureCenterX{70.0}%
\def\PictureCenterY{50.0}%
\def\SpecialCommand{lipsfile=}%
\def\PictureOrigin{u}%
\endinput%
