% Set pdfTeX parameters for pdf mode (replacing pdftex.cfg file).
% Thomas Esser, 2004. public domain.
\pdfoutput=1
\pdfcompresslevel=9
\pdfdecimaldigits=3
\pdfpagewidth=210 true mm
\pdfpageheight=297 true mm
\pdfhorigin=1 true in
\pdfvorigin=1 true in
\pdfpkresolution=600
% 
% As of TeX Live 2010, we output PDF 1.5 by default, so we can enable
% more compression.  To change this for the installation, comment out or
% delete these lines and remake the formats.  To change it for a
% particular LaTeX document, \RequirePackage{pdf14} early.
% 
\pdfminorversion=5
\pdfobjcompresslevel=2
\endinput
