% !Mode:: "TeX:UTF-8"
%% udesoftec.cls
% Copyright 2013 J. Peter M. Schuler
% 2013-08-15 v1.2.1 udesoftec
%
% This work may be distributed and/or modified under the
% conditions of the LaTeX Project Public License, either version 1.3
% of this license or (at your option) any later version.
% The latest version of this license is in
%   http://www.latex-project.org/lppl.txt
% and version 1.3 or later is part of all distributions of LaTeX
% version 2005/12/01 or later.
%
% This work has the LPPL maintenance status `maintained'.
% 
% The current Maintainer of this work is J. Peter M. Schuler
% j.peter.m.schuler@uni-due.de
%
% This work consists of the files udesoftec.cls and udesoftec.bst.
%
% As this work is based on years of mostly undocumented improvement, 
% it includes parts, for which sources can't be identified anymore. Public postings
% in the LaTeX community were used as an input and if source is known, it is
% mentioned below. If anybody identifies parts of his/her own code,
% feel free to contact the maintainer in order to get listed. 
%
% Special thanks to all contributors and for the help of the tex-live team,
% e.g. Axel K.; Norbert P.; Rainer S.; Reinhard K.; Robin F.
%
% For further information refer to:
% http://mirrors.ctan.org/macros/latex/contrib/udesoftec/README
% and
% http://mirrors.ctan.org/macros/latex/contrib/udesoftec/udesoftec.doc.pdf
\NeedsTeXFormat{LaTeX2e}%
\ProvidesPackage{udesoftec-extra}[2013/08/14 Additions for udesoftec.cls which are currently optional and may break former behaviour]%
%%%%%%%%%%%%%%%%%%%%%%%%%
% currently nothing here
%%%%%%%%%%%%%%%%%%%%%%%%%
\endinput%