%%
%% This is file `rsc.sty',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% rsc.dtx  (with options: `package')
%%  ----------------------------------------------------------------
%%  The rsc package - BibTeX and macro support for Royal Society
%%  of Chemistry and Wiley chemistry articles
%%  Maintained by Joseph A. Wright
%%  E-mail: joseph.wright@morningstar2.co.uk
%%  Released under the GNU General Public License
%%  See http://www.gnu.org/licenses/gpl.txt
%%  ----------------------------------------------------------------
\NeedsTeXFormat{LaTeX2e}
\ProvidesPackage{rsc}[2007/01/01 v1.1
Useful chemistry functions]
\RequirePackage{unitsdef,graphicx,amssymb,fixltx2e,float,varioref}
\RequirePackage[super]{cite}
\RequirePackage[labelsep=quad,labelfont=bf]{caption}
\newif\ifRSC@floatcentre\RSC@floatcentretrue
\DeclareOption{floatleft}{\global\RSC@floatcentrefalse}
\DeclareOption{fl}{\global\RSC@floatcentrefalse}
\newif\ifRSC@captioncentre\RSC@captioncentretrue
\DeclareOption{captionleft}{\global\RSC@captioncentrefalse}
\DeclareOption{cl}{\global\RSC@captioncentrefalse}
\newif\ifRSC@chapter\RSC@chapterfalse
\DeclareOption{chapter}{\global\RSC@chaptertrue}
\DeclareOption{ch}{\global\RSC@chaptertrue}
\newif\ifRSC@angew\RSC@angewfalse
\DeclareOption{angew}{\global\RSC@angewtrue%
\global\RSC@captioncentrefalse}
\ProcessOptions
\newunit{\cubiccentimeter}{\cm\unitsuperscript{3}}
\newcommand*{\cmc}{\cubiccentimeter}
\newcommand*{\Hz}{\hertz}
\newunit{\Molar}{\textsc{m}}
\newunit{\molar}{\mole\unitsep\dm\unitsuperscript{--3}}
\newunit{\mmHg}{mm\unitsep{}Hg}
\newcommand*{\standardstate}%
  {\textsuperscript{\rotatebox[origin=c]{140.8}%
  {\ensuremath{\varnothing}}}}
\newcommand*{\iPr}{\ifRSC@angew\emph{i}Pr\else Pr\textsuperscript{i}\fi}
\newcommand*{\iBu}{\ifRSC@angew\emph{i}Bu\else Bu\textsuperscript{i}\fi}
\newcommand*{\tBu}{\ifRSC@angew\emph{t}Pr\else Bu\textsuperscript{t}\fi}
\ifRSC@angew
  \def\@citess#1{\textsuperscript{[#1]}}
\fi
\ifRSC@angew
  \floatstyle{plaintop}
  \captionsetup[Table]{labelsep=colon}
  \captionsetup[Scheme]{labelsep=period}
  \captionsetup[Figure]{labelsep=period}
\fi
\ifRSC@captioncentre
  \relax
\else
  \captionsetup{singlelinecheck=off}
\fi
\ifRSC@chapter
  \ifx\chapter\@undefined
     \PackageError{rsc}{No chapters in this document}\@eha
     \newfloat{Scheme}{htbp}{los}
     \newfloat{Figure}{htbp}{lof}
     \newfloat{Table}{htbp}{lot}
  \else
     \newfloat{Scheme}{htbp}{los}[chapter]
     \newfloat{Figure}{htbp}{lof}[chapter]
     \newfloat{Table}{htbp}{lot}[chapter]
  \fi
\else
  \newfloat{Scheme}{htbp}{los}
  \newfloat{Figure}{htbp}{lof}
  \newfloat{Table}{htbp}{lot}
\fi
\floatname{Scheme}{Scheme}
\floatname{Table}{Table}
\ifRSC@angew
  \floatname{Figure}{Figure}
\else
  \floatname{Figure}{Fig.}
\fi
\ifRSC@floatcentre
  \newenvironment{scheme}[1][htbp]{\begin{Scheme}[#1]\centering}
    {\end{Scheme}}
  \renewenvironment{figure}[1][htbp]{\begin{Figure}[#1]\centering}
    {\end{Figure}}
  \renewenvironment{table}[1][htbp]{\begin{Table}[#1]\centering}
    {\end{Table}}
\else
  \newenvironment{scheme}[1][htbp]{\begin{Scheme}[#1]\flushleft}
    {\end{Scheme}}
  \renewenvironment{figure}[1][htbp]{\begin{Figure}[#1]\flushleft}
    {\end{Figure}}
  \renewenvironment{table}[1][htbp]{\begin{Table}[#1]\flushleft}
    {\end{Table}}
\fi
\newcommand*{\listofschemes}[1][List of Schemes]%
    {\listof{Scheme}{#1}}
\renewcommand*{\listoffigures}[1][List of Figures]%
    {\listof{Figure}{#1}}
\renewcommand*{\listoftables}[1][List of Tables]%
    {\listof{Table}{#1}}
\labelformat{Scheme}{Scheme~#1}
\ifRSC@angew
  \labelformat{Figure}{Figure~#1}
\else
  \labelformat{Figure}{Fig.~#1}
\fi
\labelformat{Table}{Table~#1}
\endinput
%%
%% End of file `rsc.sty'.
