<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">%%
%% This is file `bpfap7.tex',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% stepe.dtx  (with options: `bpfap7')
%% 
%%     This work has been partially funded by the US government
%%  and is not subject to copyright.
%% 
%%     This program is provided under the terms of the
%%  LaTeX Project Public License distributed from CTAN
%%  archives in directory macros/latex/base/lppl.txt.
%% 
%%  Author: Peter Wilson (CUA and NIST)
%%          now at: peter.r.wilson@boeing.com
%% 
\ProvidesFile{bpfap7.tex}[1997/09/30 AP conformance boilerplate (1)]
\typeout{bpfap7.tex [1997/09/30 AP conformance boilerplate (1)]}

  Conformance to this part of ISO 10303 includes satisfying
the requirements stated in this part, the requirements of
the implementation method(s) supported, and the relevant
requirements of the normative references.

\endinput
%%
%% End of file `bpfap7.tex'.
</pre></body></html>