%% Generated by autoinst on 2013/02/13
%%
\ProvidesFile{T1EBGaramond-Sup.fd}
    [2013/02/13 (autoinst)  Font definitions for T1/EBGaramond-Sup.]

\expandafter\ifx\csname EBGaramond@scale\endcsname\relax
    \let\EBGaramond@@scale\@empty
\else
    \edef\EBGaramond@@scale{s*[\csname EBGaramond@scale\endcsname]}%
\fi

\DeclareFontFamily{T1}{EBGaramond-Sup}{}

\DeclareFontShape{T1}{EBGaramond-Sup}{m}{n}{
      <-> \EBGaramond@@scale EBGaramond12-Regular-sup-t1
}{}

\DeclareFontShape{T1}{EBGaramond-Sup}{m}{it}{
      <-> \EBGaramond@@scale EBGaramond12-Italic-sup-t1
}{}

\DeclareFontShape{T1}{EBGaramond-Sup}{m}{sl}{
      <-> ssub * EBGaramond-Sup/m/it
}{}

\endinput
