%% Copyright (C) 2011 by Martin Scharrer <martin@scharrer.me>
%% ------------------------------------------------------------------
%% This work may be distributed and/or modified under the
%% conditions of the LaTeX Project Public License, either version 1.3
%% of this license or (at your option) any later version.
%% The latest version of this license is in
%%   http://www.latex-project.org/lppl.txt
%% and version 1.3 or later is part of all distributions of LaTeX
%% version 2005/12/01 or later.
%%
%% This work has the LPPL maintenance status `maintained'.
%%
%% The Current Maintainer of this work is Martin Scharrer.
%%
%% This work consists of the files adjustbox.dtx, adjustbox.ins
%% and the derived file adjustbox.sty.
%%
\ProvidesFile{adjpdftex.def}[%
    2011/11/14
    v0.8
    adjustbox clip driver for pdftex]
\def\@cliptoboxdim#1{%
    \setbox#1=\hbox{%
        \Gin@defaultbp\WIDTH{\wd#1}%
        \Gin@defaultbp\DEPTH{\dp#1}%
        \@tempdima\ht#1%
        \advance\@tempdima\dp#1%
        \Gin@defaultbp\TOTALHEIGHT{\@tempdima}%
        \special{pdf:content q }%
            \special{%
                pdf:literal direct
                   0 -\DEPTH\space \WIDTH\space \TOTALHEIGHT\space re
              }%
            \special{pdf:literal direct W }%
            \special{pdf:literal direct n }%
              \special{pdf:literal direct -1 0 0 -1 0 0 cm }%
                \special{pdf:content q }%
                  \special{pdf:literal direct -1 0 0 -1 0 0 cm }%
                    \box#1%
                \special{pdf:literal direct Q }%
        \special{pdf:literal direct Q }%
    }%
}
\endinput
%%
%% End of file `adjxetex.def'.
