%% Copyright (C) 2011 by Martin Scharrer <martin@scharrer.me>
%% ------------------------------------------------------------------
%% This work may be distributed and/or modified under the
%% conditions of the LaTeX Project Public License, either version 1.3
%% of this license or (at your option) any later version.
%% The latest version of this license is in
%%   http://www.latex-project.org/lppl.txt
%% and version 1.3 or later is part of all distributions of LaTeX
%% version 2005/12/01 or later.
%%
%% This work has the LPPL maintenance status `maintained'.
%%
%% The Current Maintainer of this work is Martin Scharrer.
%%
%% This work consists of the files adjustbox.dtx, adjustbox.ins
%% and the derived file adjustbox.sty.
%%
\ProvidesFile{adjpgf.def}[%
    2011/11/14
    v0.8
    adjustbox fall-back clip driver using PGF]
\RequirePackage{pgf}
\def\@cliptoboxdim#1{%
    \setbox#1\hbox{\begin{pgfpicture}%
        \pgfpathmoveto{\pgfqpoint\z@{-\dp#1}}%
        \pgfpathlineto{\pgfqpoint\z@{\ht#1}}%
        \pgfpathlineto{\pgfqpoint{\wd#1}{\ht#1}}%
        \pgfpathlineto{\pgfqpoint{\wd#1}{-\dp#1}}%
        \pgfpathclose
        \pgfusepathqclip
        \pgfset{inner sep=\z@,outer sep=\z@,minimum size=\z@}%
        \pgfnode{rectangle}{base west}{\usebox#1}{}{}%
        \pgfsetbaselinepointnow{\pgfpoint\z@\z@}%
    \end{pgfpicture}}%
}
\endinput
%%
%% End of file `adjpgf.def'.
