%% Copyright (C) 2011 by Martin Scharrer <martin@scharrer.me>
%% ------------------------------------------------------------------
%% This work may be distributed and/or modified under the
%% conditions of the LaTeX Project Public License, either version 1.3
%% of this license or (at your option) any later version.
%% The latest version of this license is in
%%   http://www.latex-project.org/lppl.txt
%% and version 1.3 or later is part of all distributions of LaTeX
%% version 2005/12/01 or later.
%%
%% This work has the LPPL maintenance status `maintained'.
%%
%% The Current Maintainer of this work is Martin Scharrer.
%%
%% This work consists of the files adjustbox.dtx, adjustbox.ins
%% and the derived file adjustbox.sty.
%%
\ProvidesFile{adjdvips.def}[%
    2011/11/14
    v0.8
    adjustbox clip driver for dvips]
\def\@cliptoboxdim#1{%
    \setbox#1=\hbox{%
        \adjsetlength\@tempdima{\ht#1+\dp#1}%
        \edef\TOTALHEIGHT{-\strip@pt\@tempdima\space}%
        \edef\DEPTH{\strip@pt\dp#1\space}%
        \edef\WIDTH{\strip@pt\wd#1\space}%
        \special{%
            ps:
              /mtrxc matrix currentmatrix def
              currentpoint gsave
              translate
              Resolution 72 div VResolution 72 div
              scale
              newpath
              0 \DEPTH \WIDTH \TOTALHEIGHT rectclip
              newpath
              mtrxc setmatrix
        }%
        \box#1%
        \special{ps: grestore }%
    }%
}
\endinput
%%
%% End of file `adjdvips.def'.
