\usemodule[tikz]%
\input chemfig.tex
\def\printatom#1{\mathematics{\mathrm#1}}
\setvalue{CF@begin@tikzpicture}{\starttikzpicture}%
\setvalue{CF@end@tikzpicture}{\stoptikzpicture}
\endinput