\subsection{Skipping Or Changing Coordinates -- Filters}
\label{sec:filters}

\begin{pgfplotsxycodekeylist}{\x\ filter,filter point}
The code keys |x filter| and |y filter| allow coordinate filtering which are based on a \emph{single} coordinate. A coordinate filter gets an input coordinate as |#1| (on input, the same value is stored in |\pgfmathresult|), applies some operation and writes the result into the macro |\pgfmathresult|. If |\pgfmathresult| is empty afterwards, the coordinate is discarded. You can also set |\pgfmathresult| to |nan| or |inf| in which case the coordinate can be either discarded (if |unbounded coords=discard| is set) or the plot can be interrupted (the case |unbounded coords=jump|).

The |filter point/.code| filter allows filtering depending on all components forming a complete point ($x$, $y$ and $z$); it is described below.

It is allowed that filters do not change |\pgfmathresult|. In this case, the unfiltered coordinate will be used.

Coordinate filters are useful in automatic processing system, where \PGFPlots\ is used to display automatically generated plots. You may not want to filter your coordinates by hand, so these options provide a tool to do this automatically.

The following filter adds $0.5$ to every $x$ coordinate.
\begin{codeexample}[]
\begin{tikzpicture}
\begin{axis}[x filter/.code=
	{\pgfmathadd{#1}{0.5}}]
\addplot coordinates {
	(4,0)
	(6,1)
};
\end{axis}
\end{tikzpicture}
\end{codeexample}
Please refer to~\cite[pgfmath manual]{tikz} for details about the math engine of \PGF. Please keep in mind that the math engine works with limited \TeX\ precision.

During evaluation of the filter, the macro |\coordindex| contains the number of the current coordinate (starting with~$0$). Thus, the following filter discards all coordinates after the $5$th and before the $10$th.
\begin{codeexample}[]
\begin{tikzpicture}
\begin{axis}[
	samples=20,
	x filter/.code={
		\ifnum\coordindex>4
			\ifnum\coordindex<11
				\def\pgfmathresult{}
			\fi
		\fi
	}]
\addplot {x^2};
\end{axis}
\end{tikzpicture}
\end{codeexample}
There is also a style key which simplifies selection by index, see below.

	\PGFPlots\ invokes the filter with argument |#1| set to the input coordinate. For $x$-filters, this is the $x$-coordinate as it is specified to |\addplot|, for $y$-filters it is the $y$-coordinate.

	If the corresponding axis is logarithmic, |#1| is the \emph{logarithm} (see |log basis x| and its variants) of the coordinate as a real number, for example |#1=4.2341|. In case the logarithm was undefined, the argument will be empty.

	The arguments to coordinate filters are minimally preprocessed: first, for logarithmic axes, the \emph{log} of the argument is supplied.  Second, any high level coordinate maps like |x coord trafo| (which may be used to map dates to numbers or string to numbers or so) are applied. In consequence, the |#1| argument is supposed to be a number. No further transformation has been applied.

	Occasionally, it might be handy to get the ``raw'', completely unprocessed input coordinate as it has been reported by the coordinate input routine. This unprocessed data is available in the three math parser constants \declareandlabel{rawx}, \declareandlabel{rawy} and \declareandlabel{rawz} (use \declareandlabel{\pgfmathrawx}, \declareandlabel{\pgfmathrawy} and \declareandlabel{\pgfmathrawz} as a way to assign the value of interest to |\pgfmathresult|). All these values are ready for use in filters (and some other methods influence plots as well).

	If key filters are invoked for |plot table|, access to the current row's data can be achieved using |\thisrow|\marg{column name} (and its variants). This includes all columns of the table.

	The |filter point| key is more technical. It doesn't take an argument: its arguments are given in terms of the |pgfkeys| variables |/data point x|, |/data point y| and |/data point z|. It may change its coordinates using |\pgfkeyssetvalue{/data point x}|\marg{new value}; access to variables can be accessed with |\pgfkeysvalueof{/data point/x}| or, if the argument shall be written into a macro, with |\pgfkeysgetvalue|. This filter is evaluated after the other ones.

	Note that you can provide different |x filter|/|y filter| arguments to each |\addplot| command. It seems there are only problems with the `|#1|' argument, and I haven't yet found out why. Please use |\pgfmathresult| in place of |#1| if you provide |\addplot[x filter/.code={...}]|.
\end{pgfplotsxycodekeylist}

\begin{stylekey}{/pgfplots/skip coords between index=\marg{begin}\marg{end}}
	A style which appends an |x filter| which discards selected coordinates. The selection is done by index where indexing starts with~$0$, see |\coordindex|. Every coordinate with index $\meta{begin} \le i < \meta{end}$ will be skipped.
\begin{codeexample}[]
\begin{tikzpicture}
\begin{axis}[
	samples=20,
	skip coords between index={5}{11},
	skip coords between index={15}{18}]

\addplot {x^2};
\end{axis}
\end{tikzpicture}
\end{codeexample}

	\paragraph{Technical note}: this style usually applies to $x$ coordinates (i.e.\ it counts $x$ coordinates). In case you want to apply it to something like |hist/data| or |quiver/u|, you can 
	\begin{enumerate}
		\item append an asterisk `|*|' to the style's name and
		\item provide the target coordinate's name as first argument.
	\end{enumerate}
	For example, |skip coords between index*={hist/data}{2}| applies to |hist/data|.
\end{stylekey}

\begin{pgfplotskey}{each nth point=\marg{integer}}
	A style which appends an |x filter| which discards all but each $n$th input coordinate.
\index{Downsampling}

	Note that there is also a |mark repeat| style which applies the same operation to plot marks only.

	\paragraph{Technical note}: this style usually applies to $x$ coordinates (i.e.\ it counts $x$ coordinates). In case you want to apply it to something like |hist/data| or |quiver/u|, you can 
	\begin{enumerate}
		\item append an asterisk `|*|' to the style's name and
		\item provide the target coordinate's name as first argument.
	\end{enumerate}
	For example, |each nth point*={hist/data}{2}| applies to |hist/data|.
\end{pgfplotskey}

\begin{pgfplotsxykeylist}{
	restrict \x\space to domain=\meta{min}:\meta{max},
	restrict \x\space to domain*=\meta{min}:\meta{max}}
\label{key:restrict:x:to:domain}
	These keys append $x$ (or $y$ or $z$) coordinate filters to restrict the respective coordinate to a domain. 
	
	The versions without star (like |restrict x to domain|) will assign the value |-inf| if the coordinate is below \meta{min} and |+inf| if the coordinate is above \meta{max}. The starred versions (like |restrict x to domain*|) will truncate coordinates to $[\hbox{\meta{min}}, \hbox{\meta{max}}]$, i.e.\ they assign the value \meta{min} if the coordinate falls outside of the lower limit and \meta{max} if the value falls outside of the upper limit.

	For logarithmic axes, \meta{min} and \meta{max} are \emph{logs} of the respective values.  A variant which uses the non-logarithmic number might be to use |restrict expr to domain={\pgfmathrawx}|\marg{min}\marg{max}.

	The non-starred versions also set |unbounded coords=jump| which leads to interrupted plots.
\begin{codeexample}[]
\begin{tikzpicture}
\begin{axis}[
	restrict y to domain=-10:10,
	samples=1000,
	% some fine-tuning for the display:
	width=10cm, height=210pt,
	xmin=-4.7124, xmax=4.7124,
	xtick={-4.7124,-1.5708,...,10},
	xticklabels={$-\frac32 \pi$,$-\pi/2$,$\pi/2$,$\frac32 \pi$},
	axis x line=center,
	axis y line=center]

\addplot[blue] gnuplot[id=tangens,domain=-1.5*pi:1.5*pi] {tan(x)};
\legend{$\tan(x)$}
\end{axis}
\end{tikzpicture}
\end{codeexample}
\end{pgfplotsxykeylist}

\begin{pgfplotskeylist}{%
	restrict expr to domain=\marg{expression}\marg{\meta{min}:\meta{max}},%
	restrict expr to domain*=\marg{expression}\marg{\meta{min}:\meta{max}}%
	}
	Appends an $x$ coordinate filter which sets the $x$ coordinate to |-inf| if the \meta{expression} evaluates to something less than \meta{min} and to |inf| if \meta{expression} evaluates to something larger than \meta{max}.

	The starred variant, |restrict to domain*| assigns \meta{min} if \meta{expression} is less then the lower limit and \meta{max} if it is larger than the upper limit.

	The non-starred version also sets |unbounded coords=jump| which leads to interrupted plots.

	In contrast to |restrict x to domain|, \meta{expression} can depend on anything which is valid during |\addplot|, in particular |\coordindex| or table columns (|\thisrow|\marg{column name} and friends). The expression doesn't need to depend on $x$ at all.
\end{pgfplotskeylist}

\begin{pgfplotskey}{@restrict to domain=\marg{filter name}\marg{expression}\marg{\meta{min}:\meta{max}}\mchoice{0,1}}
	A low--level (technical) key which allows to apply the |restrict * to ...| features also to something like |hist/data|.

	For example,
	|@restrict to domain={hist/data}{}{0:1}{0}| applies the domain-restriction to the histogram-input |hist/data|. The final `|0|' means that it works as the key |restrict x to domain=0:1|, i.e.\ it skips everything which is outside of $[0,1]$.  In a similar way, 
	|@restrict to domain={hist/data}{}{0:1}{1}| applies the functionality of |restrict x to domain*=0:1| to |hist/data|: it truncates values outside of $[0,1]$ to the domain's end-points.

	The \meta{filter name} is expected to be a coordinate name like |x|, |y|, |z| (or |hist/data|).

	The \meta{expression} configures an expression which will be used rather than the value of \meta{filter name}. It can be empty.

	The \meta{min}\texttt{:}\meta{max} are as described above.

	If the last argument is |1|, any coordinate outside of the allowed domain will take the domain boundary as value. If it is |0|, such a coordinate will get either |inf| or |-inf|.
\end{pgfplotskey}

\begin{pgfplotskey}{filter discard warning=\mchoice{true,false} (initially true)}
	Issues a notification in your logfile whenever coordinate filters discard coordinates.
\end{pgfplotskey}

You can find somewhat more on coordinate filtering in Section~\ref{pgfplots:interrupt}: ``Interrupted Plots''.
