
\section{Import/Export From Other Formats}
{
\tikzset{external/figure name/.add={}{importexport_}}%
\label{sec:pgfplots:importexport}
This section contains information of how to single pictures into separate \pdf\ graphics files (or \eps\ graphics files). Furthermore, it explains a matlab (tm) script which allows to convert from matlab to \PGFPlots.

\subsection[Export to pdf/eps]{Export to {\normalfont\pdf/\eps}}
\label{sec:pgfplots:export}
It is possible to export images to single \pdf-documents using routines of \pgfname\ and/or \Tikz.

\subsubsection{Using the Automatic Externalization Framework of \Tikz}
\begin{pgfplotslibrary}{external}
\pgfkeys{
	/pdflinks/search key prefixes in/.add={/tikz/external/,}{}
}
	The |external| library offers a convenient method to export every single |tikzpicture| into a separate~|.pdf| (or~|.eps|). Later runs of \LaTeX\ will simply include these graphics, thereby reducing typesetting time considerably.

	The library can also be used to submit documents to authors who do not even have \PGFPlots\ or \Tikz\ installed.

	\paragraph{Technical foreword:}
	The |external| library has been written by Christian Feuers\"anger (author of \PGFPlots). It has been contributed to \Tikz\ as general purpose library, so the reference documentation along with all tweaks can be found in~\cite[Section ``Externalization Library'']{tikz}. The command |\usepgfplotslibrary{external}| is actually just a wrapper which loads |\usetikzlibrary{external}| or, if this library does not yet exist because the installed \pgfname\ has at most version $2.00$, it will load a copy which is shipped with \PGFPlots.

	The |external| library has been designed such that \emph{no changes} to the document as such are necessary. The idea is as follows:
\begin{enumerate}
	\item Every |\begin{tikzpicture}| $\dotsc$ |\end{tikzpicture}| gets a file name. The file name can be assigned manually with |\tikzsetnextfilename|\marg{output file name} or automatically, in which case \meta{tex file name}|-figure|\meta{number} is used with an increasing \meta{number}.
	
	\item The library writes the resulting images using system calls of the form |pdflatex --jobname |\meta{output file name} automatically, using the write18 system call of \TeX. It is the same framework which can be used to call |gnuplot|.
\end{enumerate}
The only steps which are necessary is to use

\pgfmanualpdflabel{\textbackslash tikzexternalize}{}%
|\usepgfplotslibrary{external}|

|\tikzexternalize|

\noindent somewhere in your document's preamble (see below for system-dependent configuration options). No further modification to the document is necessary. Suppose we have a file called |test.tex|:
\begin{codeexample}[code only]
\documentclass{article}

\usepackage{pgfplots}

\usepgfplotslibrary{external}
\tikzexternalize% activate externalization!

\begin{document}
	\begin{figure}
		\begin{tikzpicture}
		\begin{axis}
			\addplot {x^2};
		\end{axis}
		\end{tikzpicture}
	\caption{Our first external graphics example}
	\end{figure}

	\begin{figure}
		\begin{tikzpicture}
		\begin{axis}
			\addplot {x^3};
		\end{axis}
		\end{tikzpicture}
	\caption{A second graphics}
	\end{figure}
\end{document}
\end{codeexample}
\noindent To enable the system calls, we type
\begin{codeexample}[code only]
pdflatex -shell-escape test
\end{codeexample}
\noindent and \LaTeX\ will now generate the required graphics files |test-figure0.pdf| and |test-figure1.pdf| automatically. Any further call to |pdflatex| will simply use |\includegraphics| and the |tikzpicture|s as such are no longer considered (you need a different command line switch for Mik\TeX, see the |shell escape| option).

If a figure shall be remade, one can simply delete all or selected graphics files and regenerate them. Alternatively, one can use the command |\tikzset{external/force remake}| somewhere in the document to remake every following picture automatically.

There are three ways to modify the file names of externalized figures:
\begin{itemize}
	\item Changing the overall file name using a |prefix|,
	\item Changing the file name for a single figure using |\tikzsetnextfilename|,
	\item Changing the file name for a restricted set of figures using |figure name|.
\end{itemize}
\begin{key}{/tikz/external/prefix=\marg{file name prefix} (initially empty)}
	A shortcut for |\tikzsetexternalprefix|\marg{file name prefix}, see below.
\end{key}

\begin{command}{\tikzsetexternalprefix\marg{file name prefix}}
	Assigns a common prefix used by all file names. For example,
\begin{codeexample}[code only]
\tikzsetexternalprefix{figures/}
\end{codeexample}
	will prepend |figures/| to every external graphics file name.
\end{command}

\begin{command}{\tikzsetnextfilename\marg{file name}}
	Sets the file name for the \emph{next} \tikzname\ picture or |\tikz| short command. It will \emph{only} be used for the next picture.

	Pictures for which no explicit file name has been set will get automatically generated file names.

	Please note that |prefix| will still be prepended to \meta{file name}.
\begin{codeexample}[code only]
\documentclass{article}
% main document, called main.tex
\usepackage{tikz}

\usepgfplotslibrary{external}
\tikzexternalize[prefix=figures/]% activate with a name prefix

\begin{document}

\tikzsetnextfilename{firstplot}
\begin{tikzpicture} % will be written to 'figures/firstplot.pdf'
\begin{axis}
	\addplot {x};  	
\end{axis}
\end{tikzpicture}

\begin{tikzpicture} % will be written to 'figures/main-figure0.pdf'
   \draw[help lines] (0,0) grid (5,5);
\end{tikzpicture}
\end{document}
\end{codeexample}
\begin{codeexample}[code only]
pdflatex -shell-escape main
\end{codeexample}
\end{command}

\begin{key}{/tikz/external/figure name=\marg{name}}
	Same as |\tikzsetfigurename|\marg{name}.
\end{key}
\begin{command}{\tikzsetfigurename\marg{name}}
	Changes the names of \emph{all} following figures. It is possible to change |figure name| during the document using |\tikzset{external/figure name|=\marg{name}|}|. A unique counter\footnote{These counters are stored into different \emph{macros}. In other words: no \TeX\ register will be needed.} will be used for each different \meta{name}, and each counter will start at $0$.

	The value of |prefix| will be applied after |figure name| has been evaluated.
\begin{codeexample}[code only]
\documentclass{article}
% main document, called main.tex
\usepackage{tikz}

\usepgfplotslibrary{external}
\tikzexternalize% activate externalization!

\begin{document}

% will be written to 'main-figure0.pdf'
\begin{tikzpicture} 
\begin{semilogyaxis}
	\addplot {exp(x)};
\end{semilogyaxis}
\end{tikzpicture}

{
  \tikzset{external/figure name={subset_}}
  A simple image is \tikz \fill (0,0) circle(5pt);. % will be written to 'subset_0.pdf'

  \begin{tikzpicture} % will be written to 'subset_1.pdf'
     \begin{axis}
	 	\addplot {x^2};
	\end{axis}
  \end{tikzpicture}
}% here, the old file name will be restored:

\begin{tikzpicture} % will be written to 'main-figure1.pdf'
   \begin{axis}
   		\addplot[domain=1e-3:100] {1/x};
	\end{axis}
\end{tikzpicture}
\end{document}
\end{codeexample}
	The scope of |figure name| ends with the next closing brace (as all values set by |\tikzset| do).

	\medbreak
	Remark: Use |\tikzset{external/figure name/.add=|\marg{prefix}\marg{suffix}|}| to prepend  a \meta{prefix} and append a \meta{suffix} to the actual value of |figure name|. Might be useful for something like
\begin{codeexample}[code only]
\tikzset{external/figure name=main}

% uses main_0.pdf, main_1.pdf, ...

\section{The first section}
{\tikzset{external/figure name/.add={}{_firstsection}}
	...
	% uses main_firstsection_0.pdf, main_firstsection_1.pdf, ...
}

\section{The second section}
{\tikzset{external/figure name/.add={}{secondsection_}}
	...
	% uses main_secondsection_0.pdf, main_secondsection_1.pdf, ...
	\subsection{Second subsection}
	{\tikzset{external/figure name/.add={}{sub_}}
		...
		% uses main_secondsection_sub_0.pdf, main_secondsection_sub_1.pdf, ...
	}
	% uses main_secondsection_2.pdf, main_secondsection_3.pdf, ...
}
\end{codeexample}
\end{command}

\begin{command}{\tikzappendtofigurename\marg{suffix}}
	Appends \meta{suffix} to the actual value of |figure name|.

	It is a shortcut for |\tikzset{external/figure name/.add={}|\marg{suffix}|}| (a shortcut which is also supported if \tikzname\ is not installed, see below).
\end{command}


\paragraph{Configuration option for \textsc{eps} output or Mik\TeX:} Since the |external| lib works by means of system calls, it has to be modified to fit the local system. This is necessary for Mik\TeX\ since it uses a different option to enable these system calls. It is also necessary for \textsc{eps} output since this involves a different set of utilities.

Note that the \emph{most important part} is to enable system calls. This is typically done by typesetting your document with |pdflatex -shell-escape| or |pdflatex -enable-write18| (Mik\TeX). These options \emph{need to be configured in your \TeX\ editor}.
Besides this step, one may want to configure the system call:

\begin{key}{/tikz/external/system call=\marg{template}}
\label{extlib:systemcall:option}
	A template string used to generate system calls. Inside of \meta{template}, the macro |\image| can be used as placeholder for the image which is about to be generated while |\texsource| contains the main file name (in truth, it contains |\input|\marg{main file name}, but that doesn't matter).

	The default is 
\begin{codeexample}[code only]
\tikzset{external/system call={pdflatex \tikzexternalcheckshellescape -halt-on-error 
    -interaction=batchmode -jobname "\image" "\texsource"}
\end{codeexample}
	\noindent where \declareandlabel{\tikzexternalcheckshellescape} inserts the value of the configuration key |shell escape|
	if and only if the current document has been typeset with |-shell-escape|\footnote{Note that this is always true for the default configuration. This security consideration applies mainly for \texttt{mode=list and make} which will also work \emph{without} shell escapes.}.

	For |eps| output, you can (and need to) use
\begin{codeexample}[code only]
\tikzset{external/system call={latex \tikzexternalcheckshellescape -halt-on-error
    -interaction=batchmode -jobname "\image" "\texsource" &&
    dvips -o "\image".ps "\image".dvi}}
\end{codeexample}
	
	The argument \meta{template} will be expanded using |\edef|, so any control sequences will be expanded. During this evaluation, `|\\|' will result in a normal backslash, `|\|'. Furthermore, double quotes `|"|', single quotes `|'|', semicolons and dashes `|-|' will be made to normal characters if any package uses them as macros. This ensures compatibility with the |german| package, for example.
\end{key}

\begin{key}{/tikz/external/shell escape=\marg{command-line arg} (initially -shell-escape)}
	Contains the command line option for |latex| which enables the |\write18| feature. 
	
	For \TeX-Live, this is |-shell-escape|. For Mik\TeX, you should use |\tikzexternalize[shell escape=-enable-write18]|.
\end{key}

\paragraph{Support for Labels and References In External Files}
The |external| library comes with extra support for |\label| and |\ref| (and other commands which usually store information in the |.aux| file) inside of external files.

There are, however, some points which need your attention when you try to use 
\begin{enumerate}
	\item[a)] |\ref| to something in the main document inside of an externalized graphics or
	\item[b)] |\label| in the externalized graphics which is referenced in the main document.
\end{enumerate}

For point a), a |\ref| inside of an externalized graphics works \emph{only} if you issue the required system call \emph{manually} or by |make|. The initial configuration |mode=convert with system call| does \emph{not} support |\ref|. But you can copy--paste the system call generated by |mode=convert with system call| and issue it manually. The reason is that |\ref| information is stored in the main |.aux| file -- but this auxiliary file is not completely written when |mode=convert with system call| is invoked (there is a race condition). Note that |\pageref| is not supported (sorry). Thus: if you have |\ref| inside of external graphics, consider using |mode=list and make| or copy--paste the system call for the image(s) and issue it manually.

Point b) is realized automatically by the external library. In detail, a |\label| inside of an externalized graphics causes the external library to generate separate auxiliary files for every external image. These files are called \meta{imagename}|.dpth|. The extension |.dpth| indicates that the file also contains the image's depth (the |baseline| key of \tikzname). Furthermore, anything which would have been written to an |.aux| file will be redirected to the |.dpth| file -- but only things which occur inside of the externalized |tikzpicture| environment. When the main document loads the image, it will copy the |.dpth| file into the main |.aux| file. Then, successive compilations of the main document contain the external |\label| information. In other words, a |\label| in an external graphics needs the following work flow:
\begin{enumerate}
	\item The external graphics needs to be generated together with its |.dpth| (usually automatically by \tikzname).
	\item The main document includes the external graphics and copies the |.dpth| content into its main |.aux| file.
	\item The main document needs to be translated once again to re-read its |.aux| file\footnote{Note that it is not possible to activate the content of an auxiliary file after \texttt{\textbackslash begin\{document\}} in \LaTeX.}.
\end{enumerate}
There is just a special case if a |\label|/|\ref| drawn as a |tikzpicture|. This is, for example, the case for the legend |\ref| images or for the |\pgfplotslegendfromname| feature. In such cases, you need to proceed as for case a) since |mode=convert with system call| can't handle that stuff on its own. 

In other words: a |\label| in an external document works automatically, just translate the main document often enough. A |\ref| might need manual adjustments as described for case a) above.


\paragraph{Operation Modes}
\begin{key}{/tikz/external/mode=\mchoice{convert with system call,list and make,$\dotsc$} (initially convert with system call)}
	This allows to change the default operation mode. There are a handful of choices possible, all of them are described in detail in~\cite[section ``Externalization Library'']{tikz}. The most useful ones are probably the initial configuration |convert with system call| and the specialized choice |list and make|.
	
	The choice |list and make| configures the library to check if there are already external graphics and uses them. If there are no graphics, the library will \emph{skip} the figure. However, it will also generate a |makefile| to generate the graphics, and a list of all required graphics files.

	It is not required to use |make|: the library expects you to generate the images somehow and it doesn't care about the ``how''. Using |make -f |\meta{name-of-tex-file}|.makefile -j 2| allows parallel execution which might, indeed, be an option. Furthermore, the makefile also supports file dependencies: if one of your data tables has been updated, the external graphics will be remade automatically. \PGFPlots\ tells the external library about any file dependencies (input files and tables).

	The two modes have the following characteristics:
	\begin{enumerate}
		\item |convert with system call| is automatic and does everything on--the--fly. However, it \emph{can't} work with |\ref| and/or |\label| information in external pictures.
		\item |list and make| requires either manual (by issuing the system calls manually) or semi--automatic conversion (using the generated \meta{main}|.makefile|), and multiple runs of |pdflatex|. The generated Makefile can be processed in parallel. Furthermore, |list and make| provides \emph{full support} for |\ref| and |\label|: any |\label| defined inside of an externalized graphics is still available for the main document.
		
		If you have legends with |legend to name| or |\label|/|\ref|, you need to generate the graphics defining the |\label| (or |legend to name|), then run |pdflatex| twice on the main document. Afterwards, you can externalize the legend graphics.
	\end{enumerate}
\end{key}

The complete reference documentation and remaining options are documented in~\cite[``Externalization Library'']{tikz}. This reference also contains information about
\begin{itemize}
	\item how to use |\tikzset{external/|\declareandlabel{force remake}|}| and |\tikzset{external/|\declareandlabel{remake next}|}| to remake selected figures,
	\item how to disable the externalization partially with |\tikzset{external/|\declareandlabel{export}|=false}| or completely with |\tikzexternaldisable|,
	\item how to optimize the speed of the conversion process using |\tikzset{external/optimize command away=\myExpensiveMacro}|,
	\item how to add further remake-dependencies with |\tikzpicturedependsonfile|\marg{name} and/or  |\tikzexternalfiledependsonfile|\marg{external file}\marg{name},
	\item examples how to enable |png| export,
	\item how to typeset such a document without \pgfname\ installed or
	\item how to provide work-arounds with |.pdf| images and bounding box restrictions.
\index{External Graphics!Bounding Box Issues}
\index{Bounding Box Control!Image Externalization Problems}
\end{itemize}

\paragraph{Using the Library Without {\normalfont\pgfname} or {\normalfont\PGFPlots} Installed}
There is a small replacement package \declareandlabel{tikzexternal.sty} which can be used once every figure has been exported. The idea is to uncomment |\usepackage{tikz}| and |\usepackage{pgfplots}| and write |\usepackage{tikzexternal}| instead:
\begin{codeexample}[code only]
% \usepackage{tikz}
% \usepackage{pgfplots}
\usepackage{tikzexternal}
\tikzexternalize% activate externalization

\begin{document}
\begin{tikzpicture}
	...
\end{tikzpicture}
...
\end{document}
\end{codeexample}
You do not need \pgfname, \tikzname\ or \PGFPlots\ installed. What you need is |tikzexternal.sty| and all generated figures (consisting of the image files, `|.pdf|' and the `|.dpth|' files containing information of the |baseline| option). The file |tikzexternal.sty| is shipped with \pgfname\ in the directory
\begin{codeexample}[code only]
latex/pgf/utilities/tikzexternal.sty
\end{codeexample}
and a copy is shipped with \PGFPlots\ in
\begin{codeexample}[code only]
tex/generic/pgfplots/oldpgfcompatib/pgfplotsoldpgfsupp_tikzexternal.sty
\end{codeexample}
Just copy the file into your directory and rename it to |tikzexternal.sty|.

\paragraph{Attention:} The small replacement package doesn't support key--value interfaces. Thus, it is necessary to use |\tikzsetexternalprefix| instead of the |prefix| option and |\tikzsetfigurename| instead of the |figure name| option since |\tikzset| is not available in such a context. Also, you may want to define a dummy--macro |\pgfplotsset| if you have used |\pgfplotsset|.
\end{pgfplotslibrary}

\subsubsection[Using the Externalization Framework of PGF By Hand]{Using the Externalization Framework of {\normalfont\pgfname} ``By Hand''}
Another way to export \TeX-pictures to single graphics files is to use the externalization framework of \pgfname, which requires more work but works more generally than the |external| library.
The basic idea is to encapsulate the desired parts with

\declareandlabel{\beginpgfgraphicnamed}\marg{output file name}

\meta{picture contents}

\declareandlabel{\endpgfgraphicnamed}. 

\noindent Furthermore, one needs to tell \pgfname\ the name of the main document using

\declareandlabel{\pgfrealjobname}\marg{the real job's name}

\noindent in the preamble. This enables two different modes: 
\begin{enumerate}
	\item The first is the normal typesetting mode. \LaTeX\ checks whether a file named \meta{output file name} with one of the accepted file extensions exists -- if that is the case, the graphics file is included with |\pgfimage| and the \meta{picture contents} is skipped. If no such file exists, the \meta{picture contents} is typeset normally. This mode is applied if |\jobname| equals \meta{the real job's name}.
	\item The second mode applies if |\jobname| equals \meta{output file name}, it initiates the ``conversion mode'' which is used to write the graphics file \meta{output file name}. In this case, \emph{only} \meta{picture contents} is written to |\jobname|, the complete rest of the \LaTeX\ is processed as normal, but it is silently discarded.

	This mode needs to be started manually with |pdflatex --jobname |\meta{output file name} for every externalized graphics file.
\end{enumerate}
A complete example may look as follows.
\begin{codeexample}[code only]
\documentclass{article}

\usepackage{pgfplots}

\pgfrealjobname{test}

\begin{document}
	\begin{figure}
		\beginpgfgraphicnamed{testfigure}
		\begin{tikzpicture}
		\begin{axis}
			\addplot {x^2};
		\end{axis}
		\end{tikzpicture}
		\endpgfgraphicnamed
	\caption{Our first external graphics example}
	\end{figure}

	\begin{figure}
		\beginpgfgraphicnamed{testfigure2}
		\begin{tikzpicture}
		\begin{axis}
			\addplot {x^3};
		\end{axis}
		\end{tikzpicture}
		\endpgfgraphicnamed
	\caption{A second graphics}
	\end{figure}
\end{document}
\end{codeexample}
\noindent The file is named |test.tex|, and it is processed (for example) with
\begin{codeexample}[code only]
pdflatex test	
\end{codeexample}
\noindent Now, we type
\begin{codeexample}[code only]
pdflatex --jobname testfigure test	
pdflatex --jobname testfigure2 test	
\end{codeexample}
\noindent to enter conversion mode. These last calls will \emph{only} write the contents of our named graphics environments, one for \meta{testfigure} and one for \meta{testfigure2} into the respective output files |testfigure.pdf| and |testfigure2.pdf|.

In summary, one needs |\pgfrealjobname| and calls |pdflatex --jobname |\meta{graphics file} for every externalized graphics environment. Please note that it is absolutely necessary to use the syntax above, \emph{not} |\begin{pgfgraphicnamed}|.

These steps are explained in much more detail in Section``Externalizing Graphics'' of~\cite{tikz}.

\paragraph{Attention:} Do not forget a correct |\pgfrealjobname| statement! If it is missing, externalization simply won't work. If it is wrong, any call to \LaTeX\ will produce empty output files.

It should be noted that this approach of image externalization is not limited to \Tikz\ picture environments. In fact, it collects everything between the begin and end statements into the external file. It is implicitly assumed that the encapsulated stuff is one box, but you can also encapsulate complete paragraphs using something like the \LaTeX\ minipage (or a |\vbox| which is not as powerful but does not affect the remaining document that much).

\begin{key}{/pgf/images/aux in dpth=\mchoice{true,false} (initially false)}
	If this boolean is set to |true|, any |\label| information generated inside of the external image is stored into the already mentioned |.dpth| file. The main document can thus reference label information of externalized parts of the document (although you may need to run |latex| several times). 

	Label support is provided for |\ref|, and probably |\cite|. The |\pageref| command is only partially supported.
\end{key}

\paragraph{Using the Library Without {\normalfont\pgfname} Installed}
Simply uncomment the packages |\usepackage{tikz}| and |\usepackage{pgfplots}| and use
\begin{codeexample}[code only]
\long\def\beginpgfgraphicnamed#1#2\endpgfgraphicnamed{%
	\begingroup
	\setbox1=\hbox{\includegraphics{#1}}%
	\openin1=#1.dpth
	\ifeof1 \box1 
	\else
		\read1 to\pgfincludeexternalgraphicsdp \closein1
		\dimen0=\pgfincludeexternalgraphicsdp\relax
		\hbox{\lower\dimen0 \box1 }%
	\fi
	\endgroup
}
\end{codeexample}
instead. This will include the generated graphics files (and it will respect the |baseline| information stored in |.dpth| files). Consequently, you won't need \pgfname\ or \PGFPlots\ installed. See Section``Externalizing Graphics'' of~\cite{tikz} for details.

\subsection{Importing From Matlab}

\subsubsection{Importing Mesh Data From Matlab To PGFPlots}
While it is easy to write Matlab vectors to files (using |save P.dat data -ASCII|), it is more involved to export mesh data.

The main problem is to communicate the mesh structure to \PGFPlots.

Here is an example how to realize this task: in Matlab, we have mesh data |X|, |Y| and |Z| which are matrices of the same size. For example, suppose we have

\begin{codeexample}[code only]
[X,Y] = meshgrid( linspace(-1,1,5), linspace(4,5,10) );
Z = X + Y;
surf(X,Y,Z)
\end{codeexample}
\noindent as data. Then, we can generate an $N \times 3$ table containing all single elements in column--wise ordering with

\begin{codeexample}[code only]
data = [ X(:) Y(:) Z(:) ]
save P.dat data -ASCII
\end{codeexample}
\noindent where the second command stores the $N \times 3$ table into |P.dat|. Finally, we can use 

|\addplot3[surf,mesh/rows=10,mesh/ordering=colwise,shader=interp] file {P.dat};|

in \PGFPlots\ to read this data. We need to provide either the number of rows ($10$ here) or the number of columns -- and the ordering (which is |colwise| for Matlab matrices).

An alternative which is faster in \PGFPlots\ would be to transpose the matrices in Matlab and tell \PGFPlots\ they are in |rowwise| ordering. So, the last step becomes

\begin{codeexample}[code only]
XX=X'; YY=Y'; ZZ=Z';
data = [ XX(:) YY(:) ZZ(:) ]
save P.dat data -ASCII
\end{codeexample}
\noindent with \PGFPlots\ command

|\addplot3[surf,mesh/cols=10,mesh/ordering=rowwise,shader=interp] file {P.dat};|.

\subsubsection{matlab2pgfplots.m}
This is a Matlab (tm) script which attempts to convert a Matlab figure to \PGFPlots. It requires Matlab version 7.4 (or higher).

\paragraph{Attention:} The author of \PGFPlots\ does not have enough time to maintain this script as much as he wants to. In other words, it supports only a small subset of \PGFPlots. You may also want to look at |matlab2tikz|, a conversion script of Nico Schl\"omer available at

\url{http://www.mathworks.com/matlabcentral/fileexchange/22022-matlab2tikz}

\noindent which also uses \PGFPlots\ for the \LaTeX\ conversion.

\medskip
The idea of |matlab2pgfplots.m| is to
\begin{itemize}
	\item use a complete matlab figure as input,
	\item acquire axis labels, axis scaling (log or normal) and legend entries,
	\item acquire all plot coordinates
\end{itemize}
and write an equivalent \texttt{.pgf} file which typesets the plot with \PGFPlots.

The intention is \emph{not} to simulate matlab. It is a first step for a conversion. Type
\begin{lstlisting}
> help matlab2pgfplots
\end{lstlisting}
on your matlab prompt for more information about its features and its limitations.

This script is experimental.

\subsubsection{matlab2pgfplots.sh}
A \texttt{bash}-script which simply starts matlab and runs 
\begin{lstlisting}
	f=hgload( 'somefigure.fig' );
	matlab2pgfplots( 'outputfile.pgf', 'fig', f );
\end{lstlisting}
See matlab2pgfplots.m above.

\subsubsection{Importing Colormaps From Matlab}
Occasionally, you may want to reuse your matlab |colormap| in \PGFPlots. Here is a small Matlab script which converts it to \PGFPlots:
\begin{codeexample}[code only]
C = colormap;  % gets data of the current colormap.
% C = colormap(jet) % gets data of "jet"
eachnth = 1;
I = 1:eachnth:size(C,1); % this is nonsense for eachnth=1 -- but perhaps you don't want each color.
CC = C(I,:);
TeXstring = [ ...
 sprintf('\\pgfplotsset{\n\tcolormap={matlab}{\n') ...
 sprintf('\t\trgb=(%f,%f,%f)\n',CC') ...
 sprintf('\t}\n}\n') ]
\end{codeexample}

\subsection{SVG Output}
It is possible to write every single \Tikz\ picture into a scalable vector graphics (\texttt{.svg}) file. This has nothing to do with \PGFPlots, it is a separate driver of \PGF. Please refer to~\cite[Section ``Producing HTML / SVG Output'']{tikz}.

\subsection{Generate \PGFPlots\ Graphics Within Python}
Mario Orne D\'IAZ ANAD\'ON contributed a small python script |pgfplots.py| which provides a simple interface to generate \PGFPlots\ figures from within python. It can be found in the \PGFPlots\ installation directory, in |pgfplots/scripts/pgfplots/pgfplots.py|; documentation can be found in the file.
}
