%%
%% This is file `pageslts-example.tex',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% pageslts.dtx  (with options: `example')
%% 
%% This is a generated file.
%% 
%% Project: pageslts
%% Version: 2013/01/28 v1.2b
%% 
%% Copyright (C) 2010 - 2013 by
%%     H.-Martin M"unch <Martin dot Muench at Uni-Bonn dot de>
%% Portions of code copyrighted by other people as marked.
%% 
%% IMPORTANT NOTICE:
%% On the first page backslash pagenumbering should be called
%% (with the appropriate argument out of e.g.
%%  * roman    - Lowercase Roman numerals: i, ii, iii, iv,...
%%  * Roman    - Uppercase Roman numerals: I, II, III, IV,...
%%  * arabic   - Arabic numerals: 1, 2, 3, 4,...
%%  * alph     - Lowercase letters: a, b, c, d,...
%%  * Alph     - Uppercase letters: A, B, C, D,...
%%  * fnsymbol - Footnote symbols: *, ^^e2^^80^^a0 (ddagger), ^^e2^^80^^a1 (dddagger),
%%                                  ^^c2^^a7 (mathsection),...
%% ). The command backslash pagenumbering is renewed, but no change
%% should be visible to the output text, because only labels are added.
%% backslash OrigPagenumbering can be used to get the original meaning
%% of backslash pagenumbering, but in that case this package does not
%% see the change in the page numbering scheme and will make mistakes.
%% The package takes options.
%% 
%% The usual disclaimer applies:
%% If it doesn't work right that's your problem.
%% (Nevertheless, send an e-mail to the maintainer
%%  when you find an error in this package.)
%% 
%% This work may be distributed and/or modified under the
%% conditions of the LaTeX Project Public License, either
%% version 1.3c of this license or (at your option) any later
%% version. This version of this license is in
%%    http://www.latex-project.org/lppl/lppl-1-3c.txt
%% and the latest version of this license is in
%%    http://www.latex-project.org/lppl.txt
%% and version 1.3c or later is part of all distributions of
%% LaTeX version 2005/12/01 or later.
%% 
%% This work has the LPPL maintenance status "maintained".
%% 
%% The Current Maintainer of this work is H.-Martin Muench.
%% 
%% This package first started as a revision of the lastpage
%% package of Jeffrey P. Goldberg (jeffrey+news at goldmark dot org),
%% but it became obvious that a replacement was needed.
%% 
%% This work consists of the main source file pageslts.dtx
%% and the derived files
%%    pageslts.sty, pageslts.pdf, pageslts.ins, pageslts.drv,
%%    pageslts-example.tex.
%% 
\documentclass[british]{article}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{lipsum}[2011/04/14]% v1.2
\usepackage[draft]{showkeys}[2007/08/07]% v3.15
%%      Use final instead of draft to hide the keys. %%
\usepackage{hyperref}[2012/11/06]% v6.83m
\hypersetup{%
 extension=pdf,%
 plainpages=false,%
 pdfpagelabels=true,%
 hyperindex=false,%
 pdflang={en},%
 pdftitle={pageslts package example},%
 pdfauthor={Hans-Martin Muench},%
 pdfsubject={Example for the pageslts package},%
 pdfkeywords={LaTeX, pageslts, H.-Martin Muench},%
 pdfview=Fit,%
 pdfstartview=Fit,%
 pdfpagelayout=SinglePage,%
 bookmarksopen=true%
}
\usepackage[pagecontinue=true,alphMult=ab,AlphMulti=AB,fnsymbolmult=true,romanMult=true,RomanMulti=true]{pageslts}[2013/01/28]% v1.2b
%% These are the default options. %%
\makeatletter
  \renewcommand{\@evenfoot}%
   {Page \thepage\ (\theCurrentPage; local: \theCurrentPageLocal) of %
    \lastpageref{pagesLTS.roman}(\lastpageref{pagesLTS.roman.local}) + %
    \lastpageref{pagesLTS.Roman}(\lastpageref{pagesLTS.Roman.local}) + %
    \lastpageref{pagesLTS.arabic}(\lastpageref{pagesLTS.arabic.local}) + %
    \lastpageref{pagesLTS.fnsymbol}(\lastpageref{pagesLTS.fnsymbol.local}) + %
    \lastpageref{pagesLTS.alph}(\lastpageref{pagesLTS.alph.local}) + %
    \lastpageref{pagesLTS.Alph}(\lastpageref{pagesLTS.Alph.local}) = %
    \lastpageref{LastPages} pages.%
   }
  \renewcommand{\@oddfoot}{\@evenfoot}
  \def\pagesLTSexampleArabic{3}
  \def\pagesLTSexamplealph{23}
  \gdef\unit#1{\mathord{\thinspace\mathrm{#1}}}%
\makeatother
\listfiles
\begin{document}
\pagenumbering{roman}
%% Note the first \pagenumbering immediately behind \begin{document}! %%
%%\addtocounter{page}{-2} %%

\section*{Example for pageslts}
\addcontentsline{toc}{section}{Example for pageslts}
\markboth{Example for pageslts}{Example for pageslts}

This example demonstrates the most common uses of package\\
\textsf{pageslts}, v1.2b as of 2013/01/28 (HMM).\\
The used options were \texttt{pagecontinue=true},
\texttt{alphMult=ab}, \texttt{AlphMulti=AB}, \linebreak
\texttt{fnsymbolmult=true},
\texttt{romanMult=true}, and \texttt{RomanMulti=true}
(the default ones).\\
For more details please see the documentation!\\

\label{keys} To hide the \pageref{keys}{\qquad } use option
\texttt{final} instead of \texttt{draft} with the \textsf{showkeys}
package (or remove the package call from the preamble of
this document).\\

\textbf{Hyperlinks or not:} If the \textsf{hyperref} package is loaded,
the references are also hyperlinked:\\
\smallskip
Page \thepage\ (\theCurrentPage; local: \theCurrentPageLocal) of %
\lastpageref{pagesLTS.roman}(\lastpageref{pagesLTS.roman.local}) + %
\lastpageref{pagesLTS.Roman}(\lastpageref{pagesLTS.Roman.local}) + %
\lastpageref{pagesLTS.arabic}(\lastpageref{pagesLTS.arabic.local}) + %
\lastpageref{pagesLTS.fnsymbol}(\lastpageref{pagesLTS.fnsymbol.local}) + %
\lastpageref{pagesLTS.alph}(\lastpageref{pagesLTS.alph.local}) + %
\lastpageref{pagesLTS.Alph}(\lastpageref{pagesLTS.Alph.local}) = %
\lastpageref{LastPages} pages.\\
If the \textsf{hyperref} package is loaded, but the hyperlinks of the
references shall be suppressed, \verb|\pageref*{...}|
and \verb|\lastpageref*{...}| can be used:\\
Page \thepage\ (\theCurrentPage; local: \theCurrentPageLocal) of %
\lastpageref*{pagesLTS.roman}(\lastpageref*{pagesLTS.roman.local}) + %
\lastpageref*{pagesLTS.Roman}(\lastpageref*{pagesLTS.Roman.local}) + %
\lastpageref*{pagesLTS.arabic}(\lastpageref*{pagesLTS.arabic.local}) + %
\lastpageref*{pagesLTS.fnsymbol}(\lastpageref*{pagesLTS.fnsymbol.local}) + %
\lastpageref*{pagesLTS.alph}(\lastpageref*{pagesLTS.alph.local}) + %
\lastpageref*{pagesLTS.Alph}(\lastpageref*{pagesLTS.Alph.local}) = %
\lastpageref*{LastPages} pages.\\

\textbf{Trademarks} appear throughout this example without any
trademark symbol; they are the property of their respective
trademark owner. There is no intention of infringement; the
usage is to the benefit of the trademark owner.\\

\textbf{Tip}: Use \textit{logical page numbers} for
the display of the pdf!\\
(In Adobe Reader XI (11.0.1): \underline{E}dit $>$
Prefere\underline{n}ces (Ctrl+k) $>$ Page Display $>$
Page Content and Information $>$ Use logical page
\nolinebreak{\underline{n}umbers.)}\\

You want negative page numbers? Not only arabic, but even roman,
Roman, alph, Alph or fnsymbol ones? No problem, e.\,g. just give a\\
\verb|\addtocounter{page}{|-\textit{some number}\verb|}| in the
source code of this example file (or uncomment the prepared line)!

\bigskip

Save per page about $200\unit{ml}$ water, $2\unit{g}$ CO$_{2}$
and $2\unit{g}$ wood:\\
Therefore please print only if this is really necessary.

\pagebreak

\tableofcontents

\newpage

\pagenumbering{roman}
%% in case the page numbering is changed before,
%% otherwise pagesLTS.current.local.roman on this page
%% would be undefined

\section{roman}

\noindent (\texttt{roman} page numbering was started before,
because the page numbering scheme was needed to start at
the first page, of course.)\\

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
\lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\
You can get this also in other formats:
\roman{CurrentPage}, \Roman{CurrentPage}, \arabic{CurrentPage},
\fnsymbol{CurrentPage}, \alph{CurrentPage}, \Alph{CurrentPage}.

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\
You can get also this in other formats, too:
\roman{pagesLTS.current.local.roman}, \Roman{pagesLTS.current.local.roman},
\arabic{pagesLTS.current.local.roman}, \fnsymbol{pagesLTS.current.local.roman},
\alph{pagesLTS.current.local.roman}, \Alph{pagesLTS.current.local.roman},
but probably it only makes sense if page numbering scheme and format are
the same, e.\,g.\\
\verb|\Roman{pagesLTS.current.local.Roman}|\\
or \verb|\Alph{pagesLTS.current.local.Alph}|. \verb|\arabic{...}| could
make sense even if combined with another page numbering scheme.
And this is exactly what \verb|\theCurrentPageLocal| does:\\
\nolinebreak{\verb|\def\theCurrentPageLocal{\arabic{pagesLTS.current.local.\pagesLTS@pnc}}|.}\\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

When the option \texttt{pagecontinue=false} is used with the
\textsf{pageslts} package, the \verb|\lastpageref{pagesLTS.Roman}| will
point to the same page as before, but this will have a lower number.\\
The \verb|\lastpageref{pagesLTS.Roman.local}| will not change,
because the number of pages does not change (only the page numbers).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{lastpage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-3]

\newpage

\pagenumbering{Roman}

\section{Roman\label{Roman}}
\subsection{Common Roman page numbering}

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
\lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-4]

\newpage

\subsection{Last page of first Roman sector}
\verb|\lastpageref{pagesLTS.Roman}| does \textbf{not}
refer to this page (but there: \lastpageref{pagesLTS.Roman}),
because the option \texttt{pagecontinue=true}
was chosen. When a reference to this page is wanted,\\
\verb|\lastpageref{pagesLTS.Roman.1}| can be used: \lastpageref{pagesLTS.Roman.1}.\\

\bigskip
There are \lastpages{Roman}{1}~pages (\verb|\lastpages{Roman}{1}|)
in this first Roman sector.\\
The Roman page numbering scheme is continued later in section~\ref{Roman2})!

\newpage

\pagenumbering{arabic}

\section{arabic}

\subsection{Standard page numbering}

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
\lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pagesLTS} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-4]
\newpage

\subsection[Empty page style]{Also an empty page style is no problem\ %
for the current or total page count}

\bigskip

\thispagestyle{empty}

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
\lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-4]

\newpage

\subsection[addtocounter, setcounter]{Neither\ %
\texttt{\textbackslash addtocounter\{page\}} nor\ %
\texttt{\textbackslash setcounter\{page\}} is a problem for the\ %
current or total page numbers}

(Here is an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}|
in the source code.)\\
\addtocounter{page}{\pagesLTSexampleArabic}

\noindent The page (from \verb|\thepage| command): \thepage \\

\noindent Current page (from \verb|\theCurrentPage|\ %
command), i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (from \verb|\theCurrentPageLocal|\ %
command), i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal\\

\noindent Last page's number (LastPages): \lastpageref{LastPages}{\hskip3em }
(= total number of pages)\\

\lipsum[1-7]

\newpage

\pagenumbering{fnsymbol}

\section{fnsymbol}

Adobe Reader XI (11.0.1) does not show the correct page names
for all pages with \texttt{fnsymbol} page numbering scheme:

\begin{center}
\begin{tabular}{c|c|c|c}
page   & page & \multicolumn{2}{c|}{shown by the Reader}                \\
number & name & without       & \multicolumn{1}{c|}{with}               \\
      &   & \multicolumn{2}{c|}{\textsf{alphalph} \&\ \textsf{pageslts}}\\ \hline
$-2$ & \texttt{LaTeX Error}               &          & \ensuremath {-\ }\\
$-1$ & \texttt{LaTeX Error}               &          & \ensuremath {- *}\\
 $0$ & (ignored by \LaTeX)                &          & 0                \\
 $1$ & \ensuremath {*}                    & *        & \ensuremath {*}  \\
 $2$ & \ensuremath {\dagger }             &          &                  \\
 $3$ & \ensuremath {\ddagger }            &          &                  \\
 $4$ & \ensuremath {\mathsection }        &          &                  \\
 $5$ & \ensuremath {\mathparagraph }      &          &                  \\
 $6$ & \ensuremath {\delimiter "026B30D } & "026B30D & \ensuremath {**} \\
 $7$ & \ensuremath {**}                   & **       &                  \\
 $8$ & \ensuremath {\dagger \dagger }     &          &                  \\
 $9$ & \ensuremath {\ddagger \ddagger }   &          &                  \\
$10$ & \texttt{LaTeX Error}               &          &                  \\
$11$ & \texttt{LaTeX Error}               &          & \ensuremath {***}\\
$12$ & \texttt{LaTeX Error}               &          &                  \\
\end{tabular}
\end{center}

\noindent and so on, while at least the (\ldots\ of \ldots ) part
of the page number is displayed correctly.\\

\bigskip

Without option \texttt{fnsymbolmult=true} of the \textsf{pageslts} package
(and the help of \textsc{Heiko Oberdiek}'s \textsf{alphalph} package),
after page~9 (\textquotedblleft \ensuremath {\ddagger \ddagger }\textquotedblright )
(and also for negative page numbers) there would just appear a
\begin{quote}
\begin{verbatim}
LaTeX Error: Counter too large
See the LaTeX manual or LaTeX Companion for explanation.
You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.
\end{verbatim}
\end{quote}
Now the page numbers after 5 (\ensuremath {\mathparagraph }) are
continued  with the doubled \textquotedblleft number\textquotedblright\ of
the first, second, third,\ldots\ page (\ensuremath {**},
\ensuremath {\dagger \dagger }, \ensuremath {\ddagger \ddagger },
\ensuremath {\mathsection \mathsection },
\ensuremath {\mathparagraph \mathparagraph }),
and after the tenth page the \textquotedblleft number\textquotedblright\ is
tripled (\ensuremath {***}, \ensuremath {\dagger \dagger \dagger },\ldots).
Page zero is named 0 and negative pages just named like the positive ones
with addition of a minus sign~($-$).

\bigskip

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
\lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-60]

\newpage

\pagenumbering{Roman}

\section{Roman - again!\label{Roman2}}

The page number would start with \textquotedblleft I\textquotedblright\ again --
but for the \textsf{pageslts} package (with option \texttt{pagecontinue=true},
or with option just \texttt{pagecontinue}, or even just
\nolinebreak{with\textbf{out}} option \texttt{pagecontinue=false}).
This package remembered the (\arabic{pagesLTS.double.Roman}-1)\footnote{%
OK, here you have to compute this value for yourself, but\ %
subtracting one should be manageable for \TeX{}nicians.} pages already
done in Roman output, and therefore continues with page
\textquotedblleft \thepage \textquotedblright .\\
If you want to start with \textquotedblleft I\textquotedblright\ all
over again, you will have two pages with the same name,
but nevertheless you can do this by using option \texttt{pagecontinue=false}
or a \verb|\setcounter{page}{1}|\ here (not demonstrated in this example file).\\

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
 \lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never
\verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-6]

\newpage

\verb|\lastpageref{pagesLTS.Roman}| does \textbf{not}
refer to this page (but there: \lastpageref{pagesLTS.Roman}),
because the option \texttt{pagecontinue=true}
was chosen. When a reference to this page is wanted,\\
\verb|\lastpageref{pagesLTS.Roman.2}| can be used: \lastpageref{pagesLTS.Roman.2}.\\

\bigskip
There are \lastpages{Roman}{2}~pages (\verb|\lastpages{Roman}{2}|) in this
second Roman sector.\\
The Roman page numbering scheme is continued later in section~\ref{Roman3})!

\newpage

\pagenumbering{alph}

\section{alph\label{alph}}

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
 \lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-4]

\newpage

Without option \texttt{alphMult=ab} of the \textsf{pageslts} (and the help of
\textsc{Heiko Oberdiek's} \textsf{alphalph} package), after page
\textquotedblleft z\textquotedblright\ there would just appear a
\begin{quote}
\begin{verbatim}
LaTeX Error: Counter too large
See the LaTeX manual or LaTeX Companion for explanation.
You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.
\end{verbatim}
\end{quote}
Now the page numbers are continued aa, ab, ac,\ldots\ (aa, bb, cc,\ldots\ is
also possible, see the \textsf{pageslts} documentation).\\
To demonstrate this, we add a\\
\verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}|\\
in the source code here.

\addtocounter{page}{\pagesLTSexamplealph}

\bigskip

\lipsum[1-18]

\newpage

\pagenumbering{Roman}

\section{Roman - third time!\label{Roman3}}

The page number would start with
\textquotedblleft I\textquotedblright\ again -- but
for the \textsf{pageslts} package (with option \texttt{pagecontinue=true},
or with option just \texttt{pagecontinue}, or even just
\nolinebreak{with\textbf{out}} option \texttt{pagecontinue=false}).
This package remembered the
(\arabic{pagesLTS.double.Roman}-1)\footnote{OK, here\ %
you have to compute this value for yourself, but\ %
subtracting one should be managable for \TeX nicians.} pages already
done in Roman output, and therefore continues with page
\textquotedblleft \thepage \textquotedblright .\\
If you want to start with \textquotedblleft I\textquotedblright\ all
over again, you will have (at least) two pages with the same name,
but nevertheless you can do this by using option
\texttt{pagecontinue=false} instead of \texttt{pagecontinue=true}
(not demonstrated here).\\

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
 \lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-3]

\newpage

\lastpageref{pagesLTS.Roman}
(\verb|\lastpageref{pagesLTS.Roman}|)
\textbf{does} refers to this page, because the option
\texttt{pagecontinue=true} was chosen. Also\\
\verb|\lastpageref{pagesLTS.Roman.3}| can be used: \lastpageref{pagesLTS.Roman.3}.\\

\bigskip

There are \lastpages{Roman}{3}~pages (\verb|\lastpages{Roman}{3}|) in this
third Roman sector.\\

\newpage

\pagenumbering{Alph}

\section{Alph}

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
 \lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\lipsum[1-3]

Without option \texttt{alphMulti=AB} of the \textsf{pageslts} (and the help of
\textsc{Heiko Oberdiek's} \textsf{alphalph} package), after page
\textquotedblleft Z\textquotedblright\ there would just appear a
\begin{quote}
\begin{verbatim}
LaTeX Error: Counter too large
See the LaTeX manual or LaTeX Companion for explanation.
You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.
\end{verbatim}
\end{quote}
Now the page numbers are continued AA, AB, AC,\ldots\ (AA, BB, CC,\ldots\ is
also possible, see the \textsf{pageslts} documentation).\\
This is not demonstrated here, but see section~\ref{alph}.

\newpage

\section{The End}

\noindent First page (\verb|\lastpageref{pagesLTS.0}|):
 \lastpageref{pagesLTS.0}\\

\noindent The page (\verb|\thepage|): \thepage \\

\noindent Current page (\verb|\theCurrentPage|),
i.\,e. counted continuously from the first page): \theCurrentPage \\

\noindent CurrentPageLocal (\verb|\theCurrentPageLocal|),
i.\,e. counted continuously from the first page of the
current page numbering scheme): \theCurrentPageLocal \\

\noindent Last roman page (pagesLTS.roman): \lastpageref{pagesLTS.roman}{\hskip4em }
(There are \lastpageref{pagesLTS.roman.local} pages with roman numbers.)\\

\noindent Last Roman page (pagesLTS.Roman): \lastpageref{pagesLTS.Roman}{\hskip3em }
(There are \lastpageref{pagesLTS.Roman.local}~pages with Roman numbers:\\
\lastpages{Roman}{1}~pages in the first Roman sector
(\pageref{Roman}{\hskip3em }-\lastpageref{pagesLTS.Roman.1}{\hskip3em }),\\
\lastpages{Roman}{2}~pages in the second Roman sector
(\pageref{Roman2}{\hskip3em }-\lastpageref{pagesLTS.Roman.2}{\hskip3em }), and\\
\lastpages{Roman}{3}~pages in the third Roman sector
(\pageref{Roman3}{\hskip3em }-\lastpageref{pagesLTS.Roman.3}{\hskip3em }).\\

\noindent Last arabic page (pagesLTS.arabic): \lastpageref{pagesLTS.arabic}{\hskip5em }
(There are only \lastpageref{pagesLTS.arabic.local} pages with arabic numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexampleArabic\verb|}| was used.)\\

\noindent Last fnsymbol page (pagesLTS.fnsymbol): \lastpageref{pagesLTS.fnsymbol} \\
(\verb|\lastpageref{pagesLTS.fnsymbol}| -- never \verb|\pageref{pagesLTS.fnsymbol}|!)\\
(There are \lastpageref{pagesLTS.fnsymbol.local} pages with fnsymbol numbers.)\\

\noindent Last alph page (pagesLTS.alph): \lastpageref{pagesLTS.alph}{\hskip4em }
(There are only \lastpageref{pagesLTS.alph.local} pages with alph numbers,
because an \verb|\addtocounter{page}{|\pagesLTSexamplealph\verb|}| was used.)\\

\noindent Last Alph page (pagesLTS.Alph): \lastpageref{pagesLTS.Alph}{\hskip4em }
(There are \lastpageref{pagesLTS.Alph.local} pages with Alph numbers.)\\

\noindent Last page's \textit{name} (LastPage): \lastpageref{LastPage}\\

\noindent Very last page's \textit{name} (VeryLastPage): \lastpageref{VeryLastPage}\\
(\texttt{LastPage} and \texttt{VeryLastPage} are identical, unless
a package with output \linebreak
\verb|\AtEndDocument| after the \textsf{pageslts} package was added.)\\

\noindent Last page's \textit{number} (LastPages): \lastpageref{LastPages}{\hskip3em }
(=~total number of pages)\\

\medskip

\noindent Page \thepage\ (\theCurrentPage; local: \theCurrentPageLocal) of %
\lastpageref{pagesLTS.roman} (\lastpageref{pagesLTS.roman.local}) + %
\lastpageref{pagesLTS.Roman} (\lastpageref{pagesLTS.Roman.local}) + %
\lastpageref{pagesLTS.arabic} (\lastpageref{pagesLTS.arabic.local}) + %
\lastpageref{pagesLTS.fnsymbol} (\lastpageref{pagesLTS.fnsymbol.local}) + %
\lastpageref{pagesLTS.alph} (\lastpageref{pagesLTS.alph.local}) + %
\lastpageref{pagesLTS.Alph} (\lastpageref{pagesLTS.Alph.local}) = %
\lastpageref{LastPages} pages.

\end{document}
\endinput
%%
%% End of file `pageslts-example.tex'.
