%%
%% This is file `ifluatex-test3.tex',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% ifluatex.dtx  (with options: `test-reload2')
%% 
%% This is a generated file.
%% 
%% Copyright (C) 2007, 2009 by Heiko Oberdiek <oberdiek@uni-freiburg.de>
%% 
%% This work may be distributed and/or modified under the
%% conditions of the LaTeX Project Public License, either
%% version 1.3 of this license or (at your option) any later
%% version. The latest version of this license is in
%%    http://www.latex-project.org/lppl.txt
%% and version 1.3 or later is part of all distributions of
%% LaTeX version 2005/12/01 or later.
%% 
%% This work has the LPPL maintenance status "maintained".
%% 
%% This Current Maintainer of this work is Heiko Oberdiek.
%% 
%% This work consists of the main source file ifluatex.dtx
%% and the derived files
%%    ifluatex.sty, ifluatex.pdf, ifluatex.ins, ifluatex.drv,
%%    ifluatex-test1.tex, ifluatex-test2.tex, ifluatex-test3.tex.
%% 
\input miniltx.tex\relax
\input ifluatex.sty\relax
\input ifluatex.sty\relax
\csname @@end\endcsname\end
\endinput
%%
%% End of file `ifluatex-test3.tex'.
