


\documentclass[12pt,a4paper]{article}

% needed packages
\usepackage{calc}
\usepackage{ifthen}
\usepackage{graphics}
\usepackage{epsfig}
\usepackage{miniplot}

% supplementary packages
\usepackage{wrapfig}
\usepackage{subfigure}
\usepackage{rotfloat}

%\usepackage{showkeys}

% personal adjustments
\newcommand{\comm}[1]{\texttt{#1}}
\renewcommand{\floatpagefraction}{0.8}    % default = 0.5, see "The LaTeX Companion, page 142"
\setcounter{plotFigures}{1}


\begin{document}

%\pagestyle{myheadings}
%\markright{Section \thesection}

\title{MiniPlot -- A Package For Easy Figure Arrangements}
\author{Tobias Wahl\footnote{I'd like to thank all the people helping me in \comm{comp.text.tex}
for answering my dull questions.}}
\date{15th June 2001}
\maketitle


\begin{abstract}
MiniPlot is a package to help \LaTeX's user to typeset eps figures
using an easy-to-use interface.

Figures can be arranged as one-figure-only or as a collection of
figure in columns and rows which can contain itself sub-figures in
columns and rows. Also wrapped figures are supported.

This package provides commands to display a framebox instead of
the figure as the graphics package does already but additionally
it writes useful information such as the label and scaling factor
into these boxes.
\end{abstract}

\tableofcontents


%=================================================================
\section{Motivation}

This section is only to show what MiniPlot is about. MiniPlot is a
strong tool for plotting multiple figures and sub-figure as the 
following figures show. It's easy to use interface allows easy and 
fast access to professional looking figure presentation.


\begin{arrangedFigure}{2}{2}{arrangedO521}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[This is a very long sub-sub-caption]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arrangedO522}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\setlength{\subFigureAboveCaptionSpace}{7mm} 
\end{arrangedFigure} 
\setlength{\subFigureAboveCaptionSpace}{0mm} 


\begin{arrangedFigure}{1}{4}{arrangedO1521}{top sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arrangedO1522}{bottom sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}


\begin{arrangedFigure}{2}{3}{arrangedO31}{top left}
    \subFig{figures/1}%
    \subFig{figures/2}%
    \subFig{figures/3}%
    \subFig{figures/4}%
    \subFig{figures/1}%
    \subFig{figures/2}%
\newSubFig{arrangedO32}{top right}
    \subFig{figures/1}%
    \subFig{figures/2}%
    \subFig{figures/3}%
    \subFig{figures/4}%
    \subFig{figures/1}%
    \subFig{figures/2}%
\newSubFig{arrangedO33}{bottom}
    \subFig{figures/1}%
    \subFig{figures/2}%
    \subFig{figures/3}%
    \subFig{figures/4}%
    \subFig{figures/1}%
    \subFig{figures/2}%
\end{arrangedFigure}



\clearpage

%================================================================= 



%---------------------------------------------------------------- 
\section{Loading the packages}

In order to run MiniPlot the following lines are needed in the \LaTeX
file


\begin{verbatim}
% needed packages
\usepackage{calc}
\usepackage{ifthen}
\usepackage{graphics}
\usepackage{epsfig}
\usepackage{miniplot}

% supplementary packages
\usepackage{wrapfig}
\usepackage{subfigure}
\usepackage{rotfloat}

% personal adjustments
\setcounter{plotFigures}{0}
\renewcommand{\floatpagefraction}{0.8}    
\end{verbatim}

The wrapfigure package is only needed when one uses the wrapfigure
features of MiniPlot. The subfigure package is certainly something
one might include since this gives access to the \comm{arrangedFigure}
environment, the most powerful feature of this package.
Rotfloat, and rotating which is loaded by rotfloat, is needed when one 
likes to use the side-way-figure capabilities of MiniPlot.
I recommend to install all packages.

Putting the line \comm{setcounter{plotFigures}{0}} is not necessary but is
recomended for editing a document with loads of figures or when one likes
to obtain the label of figures for refences.

The last line is very much my own personal style and not needed for using 
MiniPlot.



%---------------------------------------------------------------- 
\section{Including single figures}

The problem is how to arrange your eps figures efficiently in you
document. The answer is given by MiniPlot. This section is
included to provide an overview over the capabilities of MiniPlot.

We start with a simple implementation of a single eps figure as
shown in Figure \ref{fig:singleSimple}, the simple implementation
is given by

\begin{verbatim} \includeEps{figures/1}{Simple figure included 
with scaling factor equals one.}{singleSimple}{1} \end{verbatim}

\includeEps{figures/1}{Simple figure included with scaling factor 
equals one.}{singleSimple}{1}

Note that the label is given without \comm{fig:}. The general 
parameters are

\begin{verbatim}
\includeEps[htpb]{path}{label}{caption}{scaling factor}
\end{verbatim}

Now imagine one has one type of figure which occurs very often in 
the document. Then the user could use the following command

\begin{verbatim} \includeStandardGraph[htpb]{path}{label}{caption} 
\end{verbatim}

where the standard scaling factor can be set generally for all 
the figures included by this command. The default is 

\begin{verbatim} \renewcommand{\standardGraphScale}{1} 
\end{verbatim}

\includeStandardGraph{figures/1}{Simple figure included with 
scaling factor calculated to scale figure to meet specified 
width.}{singleStandard}

However, by default this value is not used but the figure is 
scaled to achieve the width equal to the length of the following 
variable.

\begin{verbatim} \setlength{\myStandardFigureWidth}{\linewidth} 
\end{verbatim}

If the figures are scaled to the width above or if a standard 
scaling factor is assumed depends on the following counter

\begin{verbatim} \setcounter{scaleToStandardFigureWidth}{1} 
\end{verbatim}

Set \comm{1} to to scale to standard-figure-width or \comm{0} to 
use standard-graph-scale. 

Additionally one can set if each figure is to be scaled 
individually or if the scaling factor is to be calculated at the 
first time the include-standard-graph command is stated

\begin{verbatim} \setcounter{scaleFigureIndividual}{1} 
\end{verbatim} 

Set \comm{1} to to scale individually or \comm{0} to use scaling 
factor calculated when inserting the first standard-graph. 

When we now include a figure using the command for standard 
figures 

\begin{verbatim} \includeStandardGraph{figures/1}{Simple figure 
included with scaling factor calculated to scale figure to meet 
specified width.}{singleStandard} 
\end{verbatim}

we obtain a figure scaled to the specified width in Figure 
\ref{fig:singleStandard}.

To show the use of the counter \comm{plotFigures} we set

\begin{verbatim} 
\setcounter{plotFigures}{0} 

\includeStandardGraph{figures/1}{Simple figure included with 
scaling factor calculated to scale figure to meet specified 
width.}{singleStandard2} 

\setcounter{plotFigures}{1} 
\end{verbatim}

to obtain Figure \ref{fig:singleStandard2}. We can see that the 
scaling factor is no more equals one. Other usefull information 
is given by the label.

\setcounter{plotFigures}{0} 
\includeStandardGraph{figures/1}{Simple figure included with 
scaling factor calculated to scale figure to meet specified 
width.}{singleStandard2} 
\setcounter{plotFigures}{1} 

Of course there is also a side-ways version of a figure, see 
Figure \ref{fig:singleStandard3}. This figure is implemented using
the include-standrd-side-ways-graph command. 

\begin{verbatim} 
\setcounter{plotFigures}{0} 

\includeStandardSideWaysGraph{figures/1}{Simple figure included with 
scaling factor calculated to scale figure to meet specified in width 
in side-ways-mode.}{singleStandard3} 

\setcounter{plotFigures}{1} 
\end{verbatim}

\setcounter{plotFigures}{0} 
\includeStandardSideWaysGraph{figures/1}{Simple figure included with 
scaling factor calculated to scale figure to meet specified 
width in side-ways-mode.}{singleStandard3} 
\setcounter{plotFigures}{1} 

Note that the width of the side-ways-figure is now determined by

\begin{verbatim} 
\setlength{\myStandardSideWaysFigureWidth}{\textheight}
\end{verbatim}

Note that there is also an include-side-ways-eps command where 
you have to set a scaling factor.










\clearpage

%---------------------------------------------------------------- 
\section{Including wrapped figures}


The use of the include-Eps-Wrap command is similar to the 
include-Eps command. By writing

\includeEpsWrap[20]{l}{figures/wrapMe}{Example of an wrapped figure}{wrappedFigure1}{1}

\begin{verbatim} \includeEpsWrap[20]{l}{figures/wrapMe}{Example of an 
wrapped figure}{wrappedFigure1}{1} \end{verbatim}

we obtain Figure \ref{fig:wrappedFigure1}.

The general form is given by

\begin{verbatim} 
\includeEpsWrap[lines]{side}{path}
{caption}{label}{scaling factor} 
\end{verbatim}

where lines stands for the number of narrow lines and side stands 
for left (l) or right (r) as specified in the documentation of the 
wrapfig package.

Of course, if the counter \comm{plotFigures} equals 0 then this figure is 
replaced by a framebox containing some useful information:

\begin{verbatim}
\setcounter{plotFigures}{0}
\includeEpsWrap[20]{l}{figures/wrapMe}
{Example of an wrapped figure}
{wrappedFigure2}{1}
\setcounter{plotFigures}{1}
\end{verbatim}

The counter \comm{plotFigures} is inteded to be \comm{0} in 
draft mode to improve browsing speed through the document and
to provide information for referencing. However, when a figure 
is to be implemented the first time one like to see the result. 
This can be done without changing the counter \comm{plotFigures}.
Simple one can add the term \comm{Now} to any command provided 
to include figures. Therefore the following command would show the 
figure and not the framebox:

\begin{verbatim}
\setcounter{plotFigures}{0}
\includeEpsWrapNow{l}{figures/wrapMe}
{Example of an wrapped figure}
{wrappedFigure3}{1}
\setcounter{plotFigures}{1}
\end{verbatim}

To customize the figure there is the width which is added to the wrapped figure
in oder to have some space between figure and text

\begin{verbatim}
\setlength{\extraWrapWidth}{2mm}
\end{verbatim}

The space above the wrapped figure is set to be

\begin{verbatim}
\setlength{\aboveWrapFigureSpace}{0mm}
\end{verbatim}



%---------------------------------------------------------------- 
\section{Including arranged sub-figures and sub-sub-figures}


The content of this subsection is the generation of figures which can
consist of several columns and rows of figures with their own caption 
(Figure ...), I will call these figures sub-figures.

Inside these sub-figures can now be arranged several columns and rows of 
sub-sub-figures. These are placed using the subfigure package.

A simple example might be given by Figure \ref{fig:arranged11} to \ref{fig:arranged12}

\begin{verbatim}
\begin{arrangedFigure}{2}{2}{arranged11}{This is the left 
                        sub-figure of an arranged figure.}
    \subFig{figures/1}%
    \subFig{figures/2}%
    \subFig{figures/3}%
    \subFig{figures/4}%
\newSubFig{arranged12}{This is the right sub-figure of an 
                                        arranged figure.}
    \subFig{figures/1}%
    \subFig{figures/2}%
    \subFig{figures/3}%
    \subFig{figures/4}%
\end{arrangedFigure}
\end{verbatim}

\begin{arrangedFigure}{2}{2}{arranged11}{This is the left sub-figure of an arranged figure.}
    \subFig{figures/1}%
    \subFig{figures/2}%
    \subFig{figures/3}%
    \subFig{figures/4}%
\newSubFig{arranged12}{This is the right sub-figure of an arranged figure.}
    \subFig{figures/1}%
    \subFig{figures/2}%
    \subFig{figures/3}%
    \subFig{figures/4}%
\end{arrangedFigure}

The first parameter to the \comm{arrangedFigure} environment is the number of 
columns of sub-figures, the second one specifies the number of columns of 
sub-sub-figures. The next parameters is the label and then the caption to the immediate
following sub-sub-figures.

The command \comm{subFig} should actually be called \comm{subSubFig} since it inserts the 
sub-sub-figure specified by the path of the figure to be included. \emph{It is important to 
enter the \%-signs after the \comm{subFig} command in order to avoid introducing 
unwanted spaces between the sub-sub-figures.}

The command \comm{newSubFig} opens the next que to fill up a sub-figure with sub-sub-figures.
The parameter is the label and the caption for the immediately following sub-figure.

Another example could be given by Figure \ref{fig:arranged2}

\begin{verbatim}
\begin{arrangedFigure}{1}{4}{arranged2}{This is the 
                only sub-figure of an arranged figure.}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}
\end{verbatim}


\begin{arrangedFigure}{1}{4}{arranged2}{This is the only sub-figure of an arranged figure.}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}

Note that the number of columns of sub-figures changed to one and that we arrange four 
sub-sub-figures in the width of one sub-figure.

Also the \comm{subFig} command got now an empty optional command leading to the indexing
of the sub-sub-figures from a to d. This behavior is identically with the one of the 
subfigure package.

To complete a list of examples a last one is given by Figure \ref{fig:arranged31} to
\ref{fig:arranged33}



\begin{verbatim}
\renewcommand{\subfigbottomskip}{0pt}%
\renewcommand{\subfigcapskip}{0pt}%
\renewcommand{\subfigcapskip}{0pt}%
\renewcommand{\subcapsize}{\scriptsize}%

\begin{arrangedFigure}{2}{4}{arranged31}{top left}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
\newSubFig{arranged32}{top right}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
\newSubFig{arranged33}{bottom}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}
\end{verbatim}

In this figure we have an odd ratio of sub-figures to sub-figure-columns
and we see that the remaining sub-figure is shifted to the right.

The same happens to the sub-sub-figures included in the top row of 
sub-figures.


    \renewcommand{\subfigbottomskip}{0pt}%
    \renewcommand{\subfigcapskip}{0pt}%
    \renewcommand{\subfigcapskip}{0pt}%
    \renewcommand{\subcapsize}{\scriptsize}%

\begin{arrangedFigure}{2}{4}{arranged31}{top left}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
\newSubFig{arranged32}{top right}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
\newSubFig{arranged33}{bottom}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}

    \renewcommand{\subfigbottomskip}{10pt}%
    \renewcommand{\subfigcapskip}{10pt}%
    \renewcommand{\subfigcapskip}{10pt}%
    \renewcommand{\subcapsize}{\footnotesize}%


The reader certainly notices that it takes longer to load the page when a lot
of sub-sub-figures are arranged. This is an important reason to set the counter 
\comm{plotFigures} to zero to save time as the reader might notice when loading
Figure \ref{fig:arranged41} to \ref{fig:arranged42}.

\begin{verbatim}
\setcounter{plotFigures}{0}
\end{verbatim}

At the same time an example of the arranged-side-ways-figure is shown. That 
this page loads faster is not theonly difference one can notice. The label for 
reference is now added to the caption in order to be easier accessible. A disadvantage 
is that the caption might become bigger and that might influence the document layout.
This might be changed in later versions and the label migth be moved to the margin or so.



\begin{verbatim}
\setcounter{plotFigures}{0}

\begin{arrangedSideWaysFigure}{2}{2}{arranged41}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged42}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedSideWaysFigure}

\setcounter{plotFigures}{1}
\end{verbatim}



\setcounter{plotFigures}{0}
\begin{arrangedSideWaysFigure}{2}{2}{arranged41}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged42}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedSideWaysFigure}
\setcounter{plotFigures}{1}


\clearpage

%---------------------------------------------------------------- 
\section{Customizing arranged figures}


For cutomizing purposes one should know that the space between 
each sub-figure is specified by

\begin{verbatim}
\setlength{\interSubFigSpace}{8mm}
\end{verbatim}

whereas the space between each sub-sub-figure is specified by

\begin{verbatim}
\setlength{\interSubSubFigSpace}{2.5mm}
\end{verbatim}

The horizontal position of the numvering of sub-sub-figures 
\emph{(a)-(..)} can be changed by changing the following length 
which default value is

\begin{verbatim}
\setlength{\subCaptionPenalty}{0mm}
\end{verbatim}

This has only an effect if the \comm{subFig} command is issued with 
an empty optional parameter.

If a sub-sub-caption is given as in the following example


\begin{verbatim}
\begin{arrangedFigure}{2}{2}{arranged511}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[This is a very long sub-sub-caption]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged512}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}
\end{verbatim}

\begin{arrangedFigure}{2}{2}{arranged511}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[This is a very long sub-sub-caption]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged512}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}

\begin{arrangedFigure}{2}{2}{arranged521}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[This is a very long sub-sub-caption]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged522}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\setlength{\subFigureAboveCaptionSpace}{7mm}
\end{arrangedFigure}
\setlength{\subFigureAboveCaptionSpace}{0mm}


then the following length can be set in order to compensate for the extra space

\begin{verbatim}
\begin{arrangedFigure}{2}{2}{arranged51}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[This is a very long sub-sub-caption]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged52}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\setlength{\subFigureAboveCaptionSpace}{7mm}
\end{arrangedFigure}
\setlength{\subFigureAboveCaptionSpace}{0mm}
\end{verbatim}


with a resulting Figure \ref{fig:arranged521} and \ref{fig:arranged522}.

If the figure looks like Figure \ref{fig:arranged5311} and \ref{fig:arranged5312} 
then one could set

\begin{verbatim}
\begin{arrangedFigure}{2}{2}{arranged531}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[This is a very long sub-sub-caption]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged532}{right sub-figure}
    \setlength{\horizontalSubSubFigSpace}{4mm}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \setlength{\horizontalSubSubFigSpace}{0mm}
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}
\end{verbatim}

to achieve Figure \ref{fig:arranged531} and \ref{fig:arranged532}.



\begin{arrangedFigure}{2}{2}{arranged5311}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[This is a very long sub-sub-caption]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged5312}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}

\begin{arrangedFigure}{2}{2}{arranged531}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[This is a very long sub-sub-caption]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged532}{right sub-figure}
    \setlength{\horizontalSubSubFigSpace}{4mm}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \setlength{\horizontalSubSubFigSpace}{0mm}
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}



Another parameter for modifying the look is given by

\begin{verbatim}
\setlength{\subFigureBelowCaptionSpace}{3mm}
\end{verbatim}

which sets the space below the main sub-figure caption and the next 
main sub-figure below it.

After all, it might be difficult to reset every variable on its 
own and to remenber their default values. Therefore, the 
command \comm{resetMiniPlot} has been introduced. This 
sets variables and commands to their default values. Note 
that the counter \comm{plotFigures} is not reset. A listing
of the definition is given below.


\begin{verbatim}
\newcommand{\resetMiniPlot}%
    {%
    \setcounter{printCaption}{1}
    \setlength{\extraWrapWidth}{2mm}    
    \setlength{\aboveWrapFigureSpace}{0mm}
    \renewcommand{\standardGraphScale}{1} 
    \setcounter{scaleToStandardFigureWidth}{1}
    \setcounter{isFirstStandardFigure}{1}
    \setcounter{scaleFigureIndividual}{1}
    \setlength{\frameBoxPenalty}{2.4mm}
    \setlength{\myStandardFigureWidth}{\linewidth}                  
    \setlength{\myStandardSubFigureWidth}{\myStandardFigureWidth}   
    \setlength{\myStandardSideWaysFigureWidth}{\textheight}
    \renewcommand{\isFirstSubFig}{false}                  
    \setlength{\subFigPenalty}{0mm}                    
    \setlength{\subSubFigPenalty}{0.001mm}              
    \setlength{\interSubFigSpace}{8mm}
    \setlength{\interSubSubFigSpace}{2.5mm}
    \setlength{\subFigureAboveCaptionSpaceDefaultOffset}{0mm}
    \setlength{\subFigureAboveCaptionSpaceDefault}{0mm} 
    \setlength{\subFigureAboveCaptionSpace}{\subFigureAboveCaptionSpaceDefault 
                                    + \subFigureAboveCaptionSpaceDefaultOffset}
    \setlength{\horizontalSubSubFigSpace}{0mm}
    \setlength{\subFigureBelowCaptionSpace}{3mm}
    \setlength{\subCaptionPenalty}{0mm}
    }%
\end{verbatim}



\clearpage






%---------------------------------------------------------------- 
\section{Debugging arranged figures}

Normally it shouldn't be necessary to do any debugging but in case there is
I'd like to mention some tweaks here.

If one is unluky one might find something like the following graph

\setlength{\subSubFigPenalty}{-1mm} 

\begin{verbatim}
\begin{arrangedFigure}{2}{2}{arranged51d}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged52d}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}
\end{verbatim}

\begin{arrangedFigure}{2}{2}{arranged51d}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged52d}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}

from which one would expect to yield two columns of sub-figures and
inside those again two columns of sub-sub-figures. However, Figure
\ref{fig:arranged51} to \ref{fig:arranged51} have only one column of
sub-sub-figures. This is because the sub-sub-figures plus the space
between them is too wide to fit into the width of the minipage environment
they are in. So, the figures are shifted down. This effect can be removed
by changing the following length which default value is

\begin{verbatim}
\setlength{\subSubFigPenalty}{0.001mm}
\end{verbatim}

\setlength{\subSubFigPenalty}{0.001mm}

Theoretical this value should be zero but due to numerical inaccuracies the 
sub-sub-figures have to be made a little bit narrower. The above length is to 
compensate for the numerical error.

By increasing the above length one can yield a satisfactory figure layout as 
can be seen in Figure

\begin{arrangedFigure}{2}{2}{arranged51dd}{left sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged52dd}{right sub-figure}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}


Another thing which is unlikely but not impossible to occur is that on has 
the displacment of figure as described above only when \comm{plotFigures} 
is equals zeros, meaning the framebox(es) are shown with the information
in it. The reason then is that the following length needs to be increased 
from its default value.

\begin{verbatim}
\setlength{\frameBoxPenalty}{2.4mm}
\end{verbatim}

The reason is that the framebox is drawn around the actual size of the 
eps-figure, this space needs to be substracted.


\clearpage








%---------------------------------------------------------------- 
\section{Referencing to figures}

Suppose the label given to a figure is \comm{arranged51dd} then the actual label
assign is \comm{fig:arranged51dd} and thats what needs to be referenced to

\begin{verbatim}
... see Figure \ref{fig:arranged51dd} ...
\end{verbatim}

... see Figure \ref{fig:arranged51dd}

Referencing to sub-sub-figures is not implemented yet but will be done in future
versions as done as the subfigure package describes. That 
is for example

\begin{verbatim}
... see Figure \ref{fig:arranged51dd-c} ...
\end{verbatim}

However, this does not work yet but if somebody knows how to extract the
\comm{a} from \comm{(a)} then it wouldn't be a problem to implement it.













%---------------------------------------------------------------- 
\section{Recommendation for working with MiniPlot}

The only recommendation there is is only to set

\begin{verbatim}
\usepackage{miniplot}
\setcounter{plotFigures}{0}
\end{verbatim}

This will display only the frameboxes of the figures and this will
increase browsing speed through the document significantly.

When implementing a figure for the first time one should use the
\comm{\~Now}-version of the implementation command, for example

\begin{verbatim}
\includeEpsNow{...
\end{verbatim}

After the figure is set and everything works fine one should remove the 
\comm{Now} to end up with

\begin{verbatim}
\includeEps{...
\end{verbatim}

When the whole document is finished one simply sets

\begin{verbatim}
\setcounter{plotFigures}{1}
\end{verbatim}

and all the figures will be shown.

Another thing regarding the subfig package is that I would suggest to use
the following setting when implementing loads of figures in an arranged figure
like Figure \ref{fig:arranged31} to \ref{fig:arranged33}.

\begin{verbatim}
\renewcommand{\subfigbottomskip}{0pt}%
\renewcommand{\subfigcapskip}{0pt}%
\renewcommand{\subfigcapskip}{0pt}%
\renewcommand{\subcapsize}{\scriptsize}%
\end{verbatim}

These settings are not used for this manual.







%---------------------------------------------------------------- 
\section{The code}

I'd like to excuse that the code is not pasted in and not explained as 
proper package writers do. I just hope that the comments might give some clue
when trying to understand pieces of \comm{miniplot.sty}.








%---------------------------------------------------------------- 
\section{Restrictions when using MiniPlot}

One restriction is that the underscore \_ is not permitted in the
labels of the figures. 

This is due to to the fact that MiniPlot displays
the labels and I need to find a proper way of doing this. The simplyfied
explanation would trying to write

\begin{verbatim}
\newcommand{\examplea}{label_lab}
\examplea
\end{verbatim}

either MiniPlot cannot display the underscore in text mode or in mathmode
the underscore has a different function and is not displayed neither. I could
imagine there is something like a temporary solution like using the let command
but this goes beyond my \LaTeX \hspace{0mm} capabilities.

Another restriction is that the path to an arranged figure cannot contain the

\begin{verbatim}
\
\end{verbatim}

sign. This might not be a major restriction.








%---------------------------------------------------------------- 
\section{Known bugs}

There is only one (fixable) bug known which is that when the 
columns of the sub-figures are not evenly filled up with 
sub-sub-figures the sub-figure shift a little bit as in Figure
\ref{fig:arranged541} to \ref{fig:arranged543}. Compare the upper boundaries 
of the two top sub-figures. There is a little vertical shift.

\begin{arrangedFigure}{2}{4}{arranged541}{top left}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged542}{top right}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
\newSubFig{arranged543}{bottom}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}

However, this can be solved by typing

\begin{verbatim}
\begin{arrangedFigure}{2}{4}{arranged551}{top left}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged552}{top right}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \setlength{\subFigureAboveCaptionSpace}{2.5mm}
\newSubFig{arranged553}{bottom}
    \setlength{\subFigureAboveCaptionSpace}{0mm}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}
\end{verbatim}

using \comm{subFigureAboveCaptionSpace}
and it follows Figure \ref{fig:arranged551} and \ref{fig:arranged553}

\begin{arrangedFigure}{2}{4}{arranged551}{top left}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\newSubFig{arranged552}{top right}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \setlength{\subFigureAboveCaptionSpace}{2.5mm}
\newSubFig{arranged553}{bottom}
    \setlength{\subFigureAboveCaptionSpace}{0mm}
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
    \subFig[]{figures/1}%
    \subFig[]{figures/2}%
    \subFig[]{figures/3}%
    \subFig[]{figures/4}%
\end{arrangedFigure}

This bug might be removed one time in the future. Sugestions are very much welcome!

\clearpage



Generally bugs can please be reported to \emph{enxtw1@nottingham.ac.uk} or 
\emph{tobias\_wahl@gmx.de}.

One thing is that one gets a lot of warnings about overfull hboxes. I am 
personally not really bothered but if somebody might come up with an idea
I would be happy to implement it.

There are just few awkward things about the code and maybe somebody has an idea
how solve things. One thing is that in the following 
function the first line seems to introduce a vertical length even if one
simply writes \comm{vspace\{0pt\}}. Due to this strange behavior I had to 
introduce the length \comm{subFigureAboveCaptionSpaceDefaultOffset} equals
3mm\footnote{I have to note that this behavior happened at one point and 
does not occur annymore. So that \comm{subFigureAboveCaptionSpaceDefaultOffset}
is set to zero. However, I decided to leave this in the code in case it might 
occur again??}.


\begin{verbatim}
\newcommand{\newSubFig}[3][\subFigureAboveCaptionSpaceDefault]%
    {%
    \vspace{\subFigureAboveCaptionSpace}%
    \ifthenelse{\value{plotFigures}>0}%
        {\caption{\myCaptionText}}%
        {\caption{\myCaptionText\printLabel{\myLabel}}}%
    \label{\myLabel}%
    \end{minipage}%
    \renewcommand{\myCaptionText}{#3}%                                                   
    \renewcommand{\myLabel}{#2}%                                                                
    \vspace{\subFigureBelowCaptionSpace}%
    \hspace{\interSubFigSpace}%
    \begin{minipage}{\myStandardSubFigureWidth}%
    \aboveCaptionSpace{#1}%
    }%
\end{verbatim}

Furthermore in the above command the following command is called

\begin{verbatim}
\newcommand{\aboveCaptionSpace}[1]{\setlength{\subFigureAboveCaptionSpace}
                            {#1 + \subFigureAboveCaptionSpaceDefaultOffset}}
\end{verbatim}

For some strange reason does the length \comm{subFigureAboveCaptionSpace} 
keep its value only in the minipage where I define it. I also cannot set the 
length outside the minipage since it did not recognize the cange within it. I 
would think that this has something to do with local and global variables but I
normally would have expected the the length in question is a global variable and
known everywhere. 

The command \comm{aboveCaptionSpace} was initially thought to be used instead of setting the
length \comm{subFigureAboveCaptionSpace} directly.





%---------------------------------------------------------------- 
\section{List of variables, commands and environments}


Note that only those variables, commands and environments are cited which
are useful for the user.


\bigskip\bigskip

\underline{Counters:}

\begin{verbatim}
\setcounter{scaleToStandardFigureWidth}{1}
\setcounter{isFirstStandardFigure}{1}
\setcounter{scaleFigureIndividual}{1}
\setcounter{plotFigures}{1}
\end{verbatim}



\bigskip\bigskip

\underline{Lengths:}

\begin{verbatim}
\setlength{\myStandardFigureWidth}{\linewidth}
\setlength{\myStandardSideWaysFigureWidth}{\textheight}

\setlength{\aboveWrapFigureSpace}{0mm}

\setlength{\interSubFigSpace}{8mm}
\setlength{\interSubSubFigSpace}{2.5mm}

\setlength{\horizontalSubSubFigSpace}{0mm}
\setlength{\subFigureAboveCaptionSpaceDefault}{0mm}
\setlength{\subFigureAboveCaptionSpace}{0mm}
\setlength{\subFigureBelowCaptionSpace}{3mm}

\setlength{\subFigPenalty}{0mm}
\setlength{\subSubFigPenalty}{0.001mm}
\setlength{\subCaptionPenalty}{0mm}
\setlength{\frameBoxPenalty}{2.4mm}
\end{verbatim}



\bigskip\bigskip

\underline{Commands:}

\begin{verbatim}
\newcommand{\isFirstSubFig}{false}
\newcommand{\standardGraphScale}{1}

\includeEps[htpb]{path}{caption}{label}{scaling}
\includeEpsNow[htpb]{path}{caption}{label}{scaling}
\includeSideWaysEps[htpb]{path}{caption}{label}{scaling}
\includeSideWaysEpsNow[htpb]{path}{caption}{label}{scaling}

\includeStandardGraph[htpb]{path}{caption}{label}
\includeStandardGraphNow[htpb]{path}{caption}{label}
\includeStandardSideWaysGraph[htpb]{path}{caption}{label}
\includeStandardSideWaysGraphNow[htpb]{path}{caption}{label}

\includeEpsWrap[narrow lines]{position}{path}{caption}{label}{scaling}
\includeEpsWrapNow[narrow lines]{position}{path}{caption}{label}{scaling}

\newcommand{\printLabel}[1]{; \large\textsc{Label}$\Rightarrow$\texttt{fig:#1}
\newSubFig[\subFigureAboveCaptionSpace]{label}{caption}
\subFig[sub-sub-caption]{path}%

\resetMiniPlot
\end{verbatim}


\bigskip\bigskip

\underline{Environments:}

\begin{verbatim}
arrangedFigure[htpb]{sub-fig columns}{sub-sub-fig columns}{label}{caption}
arrangedFigureNow[htpb]{sub-fig columns}{sub-sub-fig columns}{label}{caption}

arrangedSideWaysFigure[htpb]{sub-fig columns}{sub-sub-fig columns}
                                                            {label}{caption}
arrangedSideWaysFigureNow[htpb]{sub-fig columns}{sub-sub-fig columns}
                                                            {label}{caption}
\end{verbatim}                                                          


\end{document}
