% $Id$
% Check if a 3gb file can be created.
% (Public domain.)
\pdfoutput=1
\pdfcompresslevel=0

\topskip0pt
\newcount\n
\loop
	\pdfximage width \hsize height \vsize {poles.png}
	\hbox{\pdfrefximage\pdflastximage}
	\eject
	\advance\n by1
	\ifnum\n<3000
\repeat
\bye
