% $Id$
% Public domain.  Originally written 2010, Karl Berry.
% Test for bibtex not breaking when longer than max_print_line.

\input btxmac

\let\mbox = \hbox

\bibliography{longline}
\bibliographystyle{plain}

\nocite{*}

\end
