\documentclass[dvipdfmx]{tarticle}
\setlength{\pdfpagewidth}{\paperwidth}
\setlength{\pdfpageheight}{\paperheight}
% 以下二行をコメントアウトしたりしなかったりして試してみる．
\special{papersize=\the\paperwidth,\the\paperheight}% (a)
\AtBeginDvi{\special{papersize=\the\paperwidth, \the\paperheight}}% (b)
\begin{document}
A\pdfsavepos
\newpage
\message{pdflatexpos = \the\dimexpr\pdflastxpos sp, pdflastypos = \the\dimexpr\pdflastypos sp,
  pdfpagewidth = \the\pdfpagewidth, pdfpageheight = \the\pdfpageheight}
\end{document}