% this test is from David Jones, see 2008-05-07 ChangeLog entry.
% The bug was an eps file that includes a pfb font, i.e., arbitrary bytes.
% We don't want to strip out CTRL-D, etc.
\documentclass{article}

\usepackage{graphicx}

\begin{document}

A a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a
a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a
a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a.
\begin{figure}[h]
\includegraphics{pfbincl.eps}
\end{figure}
A a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a
a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a
a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a a.

\end{document}
