From 8e8c05aa6d6db2c28633a8924de4a0b941b52030 Mon Sep 17 00:00:00 2001
From: Karl Berry <karl@freefriends.org>
Date: Sat, 13 Jul 2019 21:39:36 +0000
Subject: circuitikz (13jul19)

git-svn-id: svn://tug.org/texlive/trunk@51634 c570f23f-e606-0410-a88d-b1316a301751
---
 Master/texmf-dist/tex/latex/circuitikz/circuitikz.sty | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'Master/texmf-dist/tex/latex/circuitikz/circuitikz.sty')

diff --git a/Master/texmf-dist/tex/latex/circuitikz/circuitikz.sty b/Master/texmf-dist/tex/latex/circuitikz/circuitikz.sty
index fddee78a01a..c480dc90ff6 100644
--- a/Master/texmf-dist/tex/latex/circuitikz/circuitikz.sty
+++ b/Master/texmf-dist/tex/latex/circuitikz/circuitikz.sty
@@ -9,8 +9,8 @@
 
 \NeedsTeXFormat{LaTeX2e}
 
-\def\pgfcircversion{0.9.2}
-\def\pgfcircversiondate{2019/06/21}
+\def\pgfcircversion{0.9.3}
+\def\pgfcircversiondate{2019/07/13}
 
 \ProvidesPackage{circuitikz}%
 [\pgfcircversiondate{} The CircuiTikz circuit drawing package version \pgfcircversion]
@@ -344,7 +344,7 @@
 \input pgfcirccurrent.tex
 \input pgfcircflow.tex
 
-% notice that the default is nooldvoltagedirections; it's not explicitly set to allow for the warning
+% notice that the default is nooldvoltagedirection; it's not explicitly set to allow for the warning
 \ExecuteOptions{nofetbodydiode, nofetsolderdot, europeancurrents, europeanvoltages,americanports, americanresistors, cuteinductors ,europeangfsurgearrester, nosiunitx, noarrowmos, smartlabels}
 
 \ProcessOptions\relax
@@ -360,7 +360,7 @@
 \ifpgf@circ@explicitvdir\else
     \PackageWarningNoLine{circuitikz}{%
         You did not specify one of the voltage directions:\MessageBreak
-        \space\space    oldvoltagedirections, nooldvoltagedirections, \MessageBreak
+        \space\space    oldvoltagedirection, nooldvoltagedirection, \MessageBreak
         \space\space    RPvoltages or EFvoltages \MessageBreak
         Default directions may have changed, \MessageBreak
         please check the manual%
-- 
cgit v1.2.3

