From c0ba26860b351ebcca9c9e6ea5b93b6fd483ff5f Mon Sep 17 00:00:00 2001
From: Karl Berry <karl@freefriends.org>
Date: Fri, 15 Nov 2019 21:42:38 +0000
Subject: tcolorbox (15nov19)

git-svn-id: svn://tug.org/texlive/trunk@52809 c570f23f-e606-0410-a88d-b1316a301751
---
 .../texmf-dist/doc/latex/tcolorbox/tcolorbox.doc.initoptions.tex | 9 +++++++++
 1 file changed, 9 insertions(+)

(limited to 'Master/texmf-dist/doc/latex/tcolorbox/tcolorbox.doc.initoptions.tex')

diff --git a/Master/texmf-dist/doc/latex/tcolorbox/tcolorbox.doc.initoptions.tex b/Master/texmf-dist/doc/latex/tcolorbox/tcolorbox.doc.initoptions.tex
index b2b742409c8..4a416542645 100644
--- a/Master/texmf-dist/doc/latex/tcolorbox/tcolorbox.doc.initoptions.tex
+++ b/Master/texmf-dist/doc/latex/tcolorbox/tcolorbox.doc.initoptions.tex
@@ -106,6 +106,15 @@ The created boxes are not numbered. This is the default. The option may
 be used to overrule a previous option.
 \end{newTcbKey}
 
+
+\begin{newTcbKey}[][doc new=2019-10-18]{reset counter on overlays}{\colOpt{=true\textbar false}}{default |true|, initially |false|}
+For |beamer| slides, this invokes the |\resetcounteronoverlays| command
+for the box counter. The counter is automatically reset on subsequent
+overlay slides of a frame.
+Thereby, the counter will be the same on all slides of every frame.
+\end{newTcbKey}
+
+
 \clearpage
 \begin{newTcbKey}{number within}{=\meta{counter}}{no default, initially unset}
 The automatic counter is set to zero, if \meta{counter} is increased.
-- 
cgit v1.2.3

