From a641be27066e63959ae974b24435aebab6754726 Mon Sep 17 00:00:00 2001
From: Karl Berry <karl@freefriends.org>
Date: Sun, 29 Apr 2018 21:46:45 +0000
Subject: milsymb (29apr18)

git-svn-id: svn://tug.org/texlive/trunk@47482 c570f23f-e606-0410-a88d-b1316a301751
---
 .../milsymb/manual_scripts/Air_upper_table.tex     | 34 ++++++++++++++++++++++
 1 file changed, 34 insertions(+)
 create mode 100644 Master/texmf-dist/doc/latex/milsymb/manual_scripts/Air_upper_table.tex

(limited to 'Master/texmf-dist/doc/latex/milsymb/manual_scripts/Air_upper_table.tex')

diff --git a/Master/texmf-dist/doc/latex/milsymb/manual_scripts/Air_upper_table.tex b/Master/texmf-dist/doc/latex/milsymb/manual_scripts/Air_upper_table.tex
new file mode 100644
index 00000000000..e82c24f3461
--- /dev/null
+++ b/Master/texmf-dist/doc/latex/milsymb/manual_scripts/Air_upper_table.tex
@@ -0,0 +1,34 @@
+\begin{tabularx}{\linewidth}{|n|s|s|s|s|s|@{}m{0pt}@{}}
+\hline
+ \thead{Value} & \thead{Glyph} & \multicolumn{4}{c|}{\thead{Examples}} \\ 
+\hline
+\texttt{airborne command post} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=airborne command post]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=airborne command post]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=airborne command post]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=airborne command post]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=airborne command post]}&\\[1.25cm] \hline
+\texttt{airborne early warning} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=airborne early warning]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=airborne early warning]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=airborne early warning]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=airborne early warning]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=airborne early warning]}&\\[1.25cm] \hline
+\texttt{anti submarine warfare} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=anti submarine warfare]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=anti submarine warfare]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=anti submarine warfare]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=anti submarine warfare]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=anti submarine warfare]}&\\[1.25cm] \hline
+\texttt{anti surface warfare} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=anti surface warfare]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=anti surface warfare]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=anti surface warfare]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=anti surface warfare]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=anti surface warfare]}&\\[1.25cm] \hline
+\texttt{cargo} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=cargo]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=cargo]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=cargo]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=cargo]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=cargo]}&\\[1.25cm] \hline
+\texttt{combat search and rescue} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=combat search and rescue]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=combat search and rescue]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=combat search and rescue]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=combat search and rescue]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=combat search and rescue]}&\\[1.25cm] \hline
+\texttt{communications} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=communications]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=communications]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=communications]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=communications]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=communications]}&\\[1.25cm] \hline
+\texttt{electronic support measures} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=electronic support measures]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=electronic support measures]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=electronic support measures]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=electronic support measures]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=electronic support measures]}&\\[1.25cm] \hline
+\texttt{escort} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=escort]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=escort]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=escort]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=escort]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=escort]}&\\[1.25cm] \hline
+\texttt{government flight} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=government flight]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=government flight]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=government flight]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=government flight]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=government flight]}&\\[1.25cm] \hline
+\texttt{intensive care} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=intensive care]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=intensive care]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=intensive care]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=intensive care]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=intensive care]}&\\[1.25cm] \hline
+\texttt{jammer} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=jammer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=jammer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=jammer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=jammer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=jammer]}&\\[1.25cm] \hline
+\texttt{jammer} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=jammer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=jammer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=jammer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=jammer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=jammer]}&\\[1.25cm] \hline
+\texttt{medical evacuation} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=medical evacuation]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=medical evacuation]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=medical evacuation]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=medical evacuation]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=medical evacuation]}&\\[1.25cm] \hline
+\texttt{mine countermeasures} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=mine countermeasures]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=mine countermeasures]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=mine countermeasures]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=mine countermeasures]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=mine countermeasures]}&\\[1.25cm] \hline
+\texttt{passenger plane} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=passenger plane]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=passenger plane]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=passenger plane]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=passenger plane]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=passenger plane]}&\\[1.25cm] \hline
+\texttt{patrol} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=patrol]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=patrol]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=patrol]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=patrol]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=patrol]}&\\[1.25cm] \hline
+\texttt{personnel recovery} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=personnel recovery]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=personnel recovery]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=personnel recovery]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=personnel recovery]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=personnel recovery]}&\\[1.25cm] \hline
+\texttt{photographic} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=photographic]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=photographic]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=photographic]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=photographic]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=photographic]}&\\[1.25cm] \hline
+\texttt{reconnaissance} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=reconnaissance]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=reconnaissance]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=reconnaissance]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=reconnaissance]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=reconnaissance]}&\\[1.25cm] \hline
+\texttt{search and rescue} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=search and rescue]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=search and rescue]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=search and rescue]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=search and rescue]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=search and rescue]}&\\[1.25cm] \hline
+\texttt{special operations forces} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=special operations forces]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=special operations forces]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=special operations forces]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=special operations forces]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=special operations forces]}&\\[1.25cm] \hline
+\texttt{suppression of enemy air defenses} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=suppression of enemy air defenses]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=suppression of enemy air defenses]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=suppression of enemy air defenses]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=suppression of enemy air defenses]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=suppression of enemy air defenses]}&\\[1.25cm] \hline
+\texttt{tanker} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=tanker]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=tanker]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=tanker]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=tanker]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=tanker]}&\\[1.25cm] \hline
+\texttt{trainer} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=trainer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=trainer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=trainer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=trainer]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=trainer]}&\\[1.25cm] \hline
+\texttt{ultra light} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=ultra light]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=ultra light]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=ultra light]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=ultra light]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=ultra light]}&\\[1.25cm] \hline
+\texttt{utility} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=utility]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=utility]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=utility]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=utility]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=utility]}&\\[1.25cm] \hline
+\texttt{very important person} & \tikz[baseline=-0.5ex]{\MilAir[faction=none, upper=very important person]} & \tikz[baseline=-0.5ex]{\MilAir[faction=friendly, upper=very important person]} & \tikz[baseline=-0.5ex]{\MilAir[faction=hostile, upper=very important person]} & \tikz[baseline=-0.5ex]{\MilAir[faction=neutral, upper=very important person]} & \tikz[baseline=-0.5ex]{\MilAir[faction=unknown, upper=very important person]}&\\[1.25cm] \hline
+\caption{Table for \texttt{upper} values in the \textbf{\texttt{MilAir}} command.}
+\end{tabularx}
\ No newline at end of file
-- 
cgit v1.2.3

