From c41e74eb5330ba759ef001e32e6652e630ac5a92 Mon Sep 17 00:00:00 2001
From: Karl Berry <karl@freefriends.org>
Date: Mon, 30 Sep 2019 21:49:03 +0000
Subject: beamer (30sep19)

git-svn-id: svn://tug.org/texlive/trunk@52222 c570f23f-e606-0410-a88d-b1316a301751
---
 .../texmf-dist/doc/latex/beamer/beamerug-compatibility.tex | 14 ++++++++++----
 1 file changed, 10 insertions(+), 4 deletions(-)

(limited to 'Master/texmf-dist/doc/latex/beamer/beamerug-compatibility.tex')

diff --git a/Master/texmf-dist/doc/latex/beamer/beamerug-compatibility.tex b/Master/texmf-dist/doc/latex/beamer/beamerug-compatibility.tex
index 37c01c0bb43..535562600f7 100644
--- a/Master/texmf-dist/doc/latex/beamer/beamerug-compatibility.tex
+++ b/Master/texmf-dist/doc/latex/beamer/beamerug-compatibility.tex
@@ -79,10 +79,10 @@ When using certain packages or classes together with the |beamer| class, extra o
   If you wish to emulate the |foils| class using \beamer, please see Section~\ref{section-foiltex}.
 \end{class}
 
-\begin{package}{{fontenc}|[|\declare{|T1,EU1,EU2|}|]|}
-  Use the |T1| option \emph{only} with fonts that have outline fonts available in the T1 encoding like |times| or the |lmodern| fonts. In a standard installation standard Computer Modern fonts (the fonts Donald Knuth originally designed and which are used by default) are \emph{not} available in the T1 encoding. Using this option with them will result in very poor rendering of your presentation when viewed with \pdf\ viewer applications like Acrobat, |xpdf|, |evince| or |okular|. To use the Computer Modern fonts with the T1 encoding, use the package |lmodern|. See also Section~\ref{section-font-encoding}. This applies both to |latex|+|dvips| and |pdflatex|
+\begin{package}{{fontenc}|[|\declare{|T1,TU|}|]|}
+  Use the |T1| option \emph{only} with fonts that have outline fonts available in the T1 encoding like |times| or the |lmodern| fonts. In a standard installation standard Computer Modern fonts (the fonts Donald Knuth originally designed and which are used by default) are \emph{not} available in the T1 encoding. Using this option with them will result in very poor rendering of your presentation when viewed with \pdf\ viewer applications like Acrobat, |xpdf|, |evince| or |okular|. To use the Computer Modern fonts with the T1 encoding, make sure you have installed |cm-super| package in your \TeX\ distribution, or use Latin Modern fonts provided by |lmorden| instead. See also Section~\ref{section-font-encoding}. This applies both to |latex|+|dvips| and |pdflatex|.
 
-  Use the |EU1| option with |xelatex|, and |EU2| option with |lualatex|. Note that |xelatex| and |luatex| support OpenType fonts, and font encodings work very different compared to |pdflatex|. Again, see Section~\ref{section-font-encoding} for more information.
+  The newest version of \LaTeXe\ kernel has introduced TU encoding for |xelatex| and |lualatex|. Note that |xelatex| and |lualatex| support OpenType fonts, and font encodings work very different compared to |pdflatex|. Again, see Section~\ref{section-font-encoding} for more information.
 \end{package}
 
 \begin{package}{{fourier}}
@@ -168,7 +168,13 @@ When using certain packages or classes together with the |beamer| class, extra o
 
 \begin{package}{{paralist}}
   \beamernote
-  \beamer\ automatically patches list-related commands using |beamerpatchparalist| package at the beginning of document.
+  \beamer\ automatically patches list-related commands using |beamerpatchparalist| package at the beginning of document. Besides, \beamer\ also supports using |compactitem| and |compactenum| environments with overlays, just like the usage of |enumerate| environments:
+\begin{verbatim}
+\begin{compactitem}[<+->][$\bullet$]
+  \item Alpha
+  \item Bravo
+\end{compactitem}
+\end{verbatim}
 \end{package}
 
 \begin{package}{{pdfpages}}
-- 
cgit v1.2.3

