From 1b2dc80bc47f12c5846e7616c287a772be5de763 Mon Sep 17 00:00:00 2001
From: Karl Berry <karl@freefriends.org>
Date: Sat, 12 Dec 2009 00:36:11 +0000
Subject: acronym update (11dec09)

git-svn-id: svn://tug.org/texlive/trunk@16368 c570f23f-e606-0410-a88d-b1316a301751
---
 Master/texmf-dist/doc/latex/acronym/acrotest.tex | 9 +++++++++
 1 file changed, 9 insertions(+)

(limited to 'Master/texmf-dist/doc/latex/acronym/acrotest.tex')

diff --git a/Master/texmf-dist/doc/latex/acronym/acrotest.tex b/Master/texmf-dist/doc/latex/acronym/acrotest.tex
index 532ff3146ef..e48b2eea4a3 100644
--- a/Master/texmf-dist/doc/latex/acronym/acrotest.tex
+++ b/Master/texmf-dist/doc/latex/acronym/acrotest.tex
@@ -22,6 +22,7 @@
 %%   Grave accent  \`     Left brace    \{     Vertical bar  \|
 %%   Right brace   \}     Tilde         \~}
 %%
+%%
 \documentclass{article}
 \usepackage{hyperref}
 \usepackage[printonlyused,withpage]{acronym}
@@ -63,6 +64,11 @@ between the constant of Boltzmann and the \acl{NA}:
 
 \acl{lox}/\acl{lh2} (\acsu{lox}/\acsu{lh2})
 
+\subsection{Some testing fundamentals}
+When testing \acp{IC}, one typically wants to identify functional
+blocks to be tested separately. The latter are commonly indicated as
+\acp{BUT}. To test a \ac{BUT} requires defining a testing strategy\dots
+
 \section{Acronyms}
 \begin{acronym}[TDMA]
  \acro{CDMA}{Code Division Multiple Access}
@@ -75,6 +81,9 @@ between the constant of Boltzmann and the \acl{NA}:
  \acro{UA}{Used Acronym}
  \acro{lox}[\ensuremath{LOX}]{Liquid Oxygen}%
  \acro{lh2}[\ensuremath{LH_2}]{Liquid Hydrogen}%
+ \acro{IC}{Integrated Circuit}%
+ \acro{BUT}{Block Under Test}%
+ \acrodefplural{BUT}{Blocks Under Test}%
 \end{acronym}
 
 \end{document}
-- 
cgit v1.2.3

