From cb02a75d8a40f5c0f829fad0235477685f3591b8 Mon Sep 17 00:00:00 2001
From: Karl Berry <karl@freefriends.org>
Date: Sat, 10 Jul 2010 00:06:53 +0000
Subject: pst-electricfield update (3jul10)

git-svn-id: svn://tug.org/texlive/trunk@19320 c570f23f-e606-0410-a88d-b1316a301751
---
 .../pst-electricfield/pst-electricfield-docFR.tex  | 55 ++++++++++++----------
 1 file changed, 30 insertions(+), 25 deletions(-)

(limited to 'Master/texmf-dist/doc/generic/pst-electricfield/pst-electricfield-docFR.tex')

diff --git a/Master/texmf-dist/doc/generic/pst-electricfield/pst-electricfield-docFR.tex b/Master/texmf-dist/doc/generic/pst-electricfield/pst-electricfield-docFR.tex
index 921a3513ae6..7290e8ee1b4 100644
--- a/Master/texmf-dist/doc/generic/pst-electricfield/pst-electricfield-docFR.tex
+++ b/Master/texmf-dist/doc/generic/pst-electricfield/pst-electricfield-docFR.tex
@@ -1,16 +1,18 @@
-%% $Id: pst-electricfield-docFR.tex 336 2010-05-29 18:38:59Z herbert $
+%% $Id: pst-electricfield-docFR.tex 354 2010-06-18 17:18:01Z herbert $
 \documentclass[11pt,english,french,BCOR10mm,DIV12,bibliography=totoc,parskip=false,smallheadings
     headexclude,footexclude,oneside]{pst-doc}
 \usepackage[latin1]{inputenc}
 \usepackage{pst-electricfield}
 
 \usepackage{pst-electricfield}
+\let\pstEFfv\fileversion
 \usepackage{pst-func}
 \usepackage{pst-exa}% only when running pst2pdf
-\usepackage{esint}
+%\let\PSTexample\LTXexample        % when not running pst2pdf
+%\let\endPSTexample\endLTXexample  % when not running pst2pdf
 
+\usepackage{esint}
 
-\let\pstEFfv\fileversion
 \lstset{pos=t,language=PSTricks,
     morekeywords={psElectricfield,psEquipotential},basicstyle=\footnotesize\ttfamily}
 \newcommand\Cadre[1]{\psframebox[fillstyle=solid,fillcolor=black,linestyle=none,framesep=0]{#1}}
@@ -307,7 +309,8 @@ Les 
 \begin{equation*}
 \frac{\text{d}y}{\text{d}x}=-\frac{E_x}{E_y}
 \end{equation*}
-C'est une \'{e}quation différentielle d'ordre 1. On utilise encore : \verb!\psplotDiffEqn! pour tracer les équipotentielles.
+C'est une \'{e}quation différentielle d'ordre 1. On utilise encore : \verb!\psplotDiffEqn! pour 
+tracer les équipotentielles.
 \begin{verbatim}
 \pstVerb{%
 /q1 1 def
@@ -351,7 +354,8 @@ Elles se tracent avec la commande : \verb+\psElectricfield[options]+, les param
   relation, il suffit de positionner le booléen \textsf{chargeradius} à \textsf{false} : \textsf{chargeradius=false}. Le rayon de la charge est lié à \textsf{runit}, c'est donc cette valeur qu'il faudra modifier pour agrandir ou diminuer ce rayon.
 \end{enumerate}
 \section{Les équipotentielles}
-Elles se tracent avec la commande : \Lcs{psEquipotential}[options](xmin,ymin)(xmax,ymax)+. Les options de charge comprennent 
+Elles se tracent avec la commande : \Lcs{psEquipotential}[options](xmin,ymin)(xmax,ymax)+. Les options 
+de charge comprennent 
 les mêmes paramètres \textsf{Q} que pour les lignes de champ, il est inutile d'indiquer~\textsf{N}.
 \begin{enumerate}
   \item Il faut prévoir les valeurs maximale et minimale du potentiel : \textsf{Vmax=3} et \textsf{Vmin=-1} : valeurs par défaut.
@@ -363,9 +367,10 @@ les m
   \textsf{Vmax=0} et \textsf{Vmin=0} et de choisir une couleur différente des autres.
 \end{enumerate}
 
+\clearpage
 \section{Exemples}
 
-\begin{LTXexample}[pos=t]
+\begin{PSTexample}[pos=t]
 \begin{pspicture*}(-6,-6)(6,6)
 \psframe*[linecolor=lightgray!50](-6,-6)(6,6)
 \psgrid[subgriddiv=0,gridcolor=gray,griddots=10]
@@ -373,9 +378,9 @@ les m
 \psEquipotential[Q={[-1 -2 2][1 2 2][-1 2 -2][1 -2 -2]},linecolor=blue](-6.1,-6.1)(6.1,6.1)
 \psEquipotential[Q={[-1 -2 2][1 2 2][-1 2 -2][1 -2 -2]},linecolor=green,linewidth=2\pslinewidth,Vmax=0,Vmin=0](-6.1,-6.1)(6.1,6.1)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
-\begin{LTXexample}[pos=t]
+\begin{PSTexample}[pos=t]
 \begin{pspicture*}(-6,-6)(6,6)
 \psframe*[linecolor=lightgray!50](-6,-6)(6,6)
 \psgrid[subgriddiv=0,gridcolor=gray,griddots=10]
@@ -383,10 +388,10 @@ les m
 \psEquipotential[Q={[-1 -2 2][1 2 2][-1 2 -2][1 -2 -2]},linecolor=blue](-6,-6)(6,6)
 \psEquipotential[Q={[-1 -2 2][1 2 2][-1 2 -2][1 -2 -2]},linecolor=green,linewidth=2\pslinewidth,Vmax=0,Vmin=0](-6.1,-6.1)(6.1,6.1)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
 
-\begin{LTXexample}[pos=t]
+\begin{PSTexample}[pos=t]
 \begin{pspicture*}(-5,-5)(5,5)
 \psframe*[linecolor=lightgray!40](-5,-5)(5,5)
 \psgrid[subgriddiv=0,gridcolor=lightgray,griddots=10]
@@ -394,11 +399,11 @@ les m
 \psEquipotential[Q={[-1 -3 1][1 1 -3][-1 2 2]},linecolor=blue](-6,-6)(6,6)
 \psEquipotential[Q={[-1 -3 1][1 1 -3][-1 2 2]},linecolor=green,Vmin=-5,Vmax=-5,linewidth=2\pslinewidth](-6,-6)(6,6)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
 
 
-\begin{LTXexample}[pos=t,vsep=5mm]
+\begin{PSTexample}[pos=t,vsep=5mm]
 \psset{unit=0.75cm}
 \begin{pspicture*}(-5,-5)(5,5)
 \psframe*[linecolor=green!20](-5,-5)(5,5)
@@ -407,9 +412,9 @@ les m
 \psEquipotential[Q={[1 -2 0][-1 2 0]},linecolor=blue](-5,-5)(5,5)
 \psEquipotential[Q={[1 -2 0][-1 2 0]},linecolor=green,Vmin=0,Vmax=0](-5,-5)(5,5)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
-\begin{LTXexample}[pos=t,vsep=5mm]
+\begin{PSTexample}[pos=t,vsep=5mm]
 \psset{unit=0.75cm}
 \begin{pspicture*}(-5,-5)(5,5)
 \psframe*[linecolor=green!20](-5,-5)(5,5)
@@ -418,9 +423,9 @@ les m
 \psEquipotential[Q={[1 -2 0][1 2 0]},linecolor=blue,Vmin=0,Vmax=20,stepV=2](-5,-5)(5,5)
 \psEquipotential[Q={[1 -2 0][1 2 0]},linecolor=green,Vmin=9,Vmax=9](-5,-5)(5,5)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
-\begin{LTXexample}[pos=t,vsep=5mm]
+\begin{PSTexample}[pos=t,vsep=5mm]
 \psset{unit=0.75cm}
 \begin{pspicture*}(-10,-5)(6,5)
 \psframe*[linecolor=lightgray!40](-10,-5)(6,5)
@@ -431,9 +436,9 @@ les m
 \rput(0,0){\textcolor{white}{\large$-$}}
 \multido{\rA=4.75+-0.5}{20}{\rput(-9.75,\rA){\textcolor{white}{\large$+$}}}
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
-\begin{LTXexample}[pos=t,vsep=5mm]
+\begin{PSTexample}[pos=t,vsep=5mm]
 \psset{unit=0.75cm}
 \begin{pspicture*}(-5,-5)(5,5)
 \psframe*[linecolor=green!20](-6,-5)(6,5)
@@ -441,9 +446,9 @@ les m
 \psElectricfield[Q={[1 -2 -2][1 -2 2][1 2 2][1 2 -2]},linecolor={[HTML]{006633}}]
 \psEquipotential[Q={[1 -2 -2][1 -2 2][1 2 2][1 2 -2]},Vmax=15,Vmin=0,stepV=1,linecolor=blue](-6,-6)(6,6)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
-\begin{LTXexample}[pos=t,vsep=5mm]
+\begin{PSTexample}[pos=t,vsep=5mm]
 \psset{unit=0.75cm}
 \begin{pspicture*}(-5,-5)(5,5)
 \psframe*[linecolor=green!20](-5,-5)(5,5)
@@ -451,9 +456,9 @@ les m
 \psElectricfield[Q={[1 2 0][1 1 1.732][1 -1 1.732][1 -2 0][1 -1 -1.732][1 1 -1.732]},linecolor=red]
 \psEquipotential[Q={[1 2 0][1 1 1.732 12][1 -1 1.732][1 -2 0][1 -1 -1.732][1 1 -1.732]},linecolor=blue,Vmax=50,Vmin=0,stepV=5](-5,-5)(5,5)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
-\begin{LTXexample}[pos=t,vsep=5mm]
+\begin{PSTexample}[pos=t,vsep=5mm]
 \psset{unit=0.75cm}
 \begin{pspicture*}(-5,-5)(5,5)
 \psframe*[linecolor=green!20](-5,-5)(5,5)
@@ -461,9 +466,9 @@ les m
 \psElectricfield[Q={[1 2 0][1 1 1.732][1 -1 1.732][1 -2 0][1 -1 -1.732][1 1 -1.732][-1 0 0]},linecolor=red]
 \psEquipotential[Q={[1 2 0][1 1 1.732 12][1 -1 1.732][1 -2 0][1 -1 -1.732][1 1 -1.732][-1 0 0]},Vmax=40,Vmin=-10,stepV=5,linecolor=blue](-5,-5)(5,5)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
-\begin{LTXexample}[pos=t,vsep=5mm]
+\begin{PSTexample}[pos=t,vsep=5mm]
 \psset{unit=0.75cm}
 \begin{pspicture*}(-6,-5)(6,5)
 \psframe*[linecolor=green!20](-6,-5)(6,5)
@@ -471,7 +476,7 @@ les m
 \psElectricfield[Q={[1 -4 0][1 -2 0 12][1 0 0][1 2 0][1 4 0]},linecolor=red]
 \psEquipotential[Q={[1 -4 0][1 -2 0][1 0 0][1 2 0][1 4 0]},linecolor=blue,Vmax=30,Vmin=0,stepV=2](-7,-5)(7,5)
 \end{pspicture*}
-\end{LTXexample}
+\end{PSTexample}
 
 
 \clearpage
-- 
cgit v1.2.3

