\documentclass{article}
\usepackage[designiv]{web}
\usepackage{eforms}

\begin{defineJS}{\isImportAnFDFKnown}
console.clear(); console.show();
if ( typeof aebImportAnFDF == "function" ) {
    app.beep(0);
    console.println("aeb.js is successfully installed, congratulations!");
    console.println("\\nYou're ready to Rock with AcroTeX!");
} else {
    app.beep(0); app.beep(0);
    console.println("aeb.js is not, repeat NOT, installed correctly!");
}
\end{defineJS}

\thispagestyle{empty}
\parindent0pt\parskip6pt

\begin{document}

This is a file to test your \textsf{AeB} installation.

To test the \textsf{AeB} installation, press this button:
\pushButton[\CA{Test AeB}\A{\JS{\isImportAnFDFKnown}}]{btnTest}{}{11bp}

Upon pressing the button, if you have installed the \texttt{aeb.js} file
correctly, a congratulatory message appears in the console window; if the
installation is not correct, a message informs you so.

On failure, did you close \textsf{Acrobat} before opening this file? (The JS
files are only read once when the \textsf{Acrobat} application is opened.)
When all else fails, try rereading the installation instructions again
(\texttt{install\_jsfiles.pdf}), found in the \texttt{doc} folder, but more
carefully this time.

Still failing? Do you have \textsf{Acrobat DC}? Perhaps your \textsf{Acrobat}
needs to be configured. Try reading \texttt{acrobat-in-workflow.pdf}, found
in the \texttt{doc} folder.



\end{document}
