From 8731cc5ad70723b9a155917df509d857579c355d Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Tue, 21 Apr 2020 03:02:38 +0000
Subject: CTAN sync 202004210302

---
 .../reledmac/doc-more/page-typesetting-columns.tex | 22 +++++++++++-----------
 1 file changed, 11 insertions(+), 11 deletions(-)

(limited to 'macros/latex/contrib/reledmac/doc-more/page-typesetting-columns.tex')

diff --git a/macros/latex/contrib/reledmac/doc-more/page-typesetting-columns.tex b/macros/latex/contrib/reledmac/doc-more/page-typesetting-columns.tex
index e40dc5f6ff..70986e353f 100644
--- a/macros/latex/contrib/reledmac/doc-more/page-typesetting-columns.tex
+++ b/macros/latex/contrib/reledmac/doc-more/page-typesetting-columns.tex
@@ -1,7 +1,7 @@
 \documentclass[11pt,a4paper]{article}
 \usepackage{fontspec}
 \usepackage{unicode-math}
-\usepackage{libertineotf}
+\usepackage{libertine}
 \usepackage{tikz}
 \usepackage{csquotes}
 \newcommand{\package}[1]{\emph{#1}}
@@ -34,7 +34,7 @@
 \section{General}
 \package{Reledmac} doesn't care neither text width ($T$) nor margins, whose sizes are calculated by \LaTeX{} itself or depends on other packages like \package{geometry}. In normal typesetting, line numbers and sidenotes are in the margin.
 
-In parallel typesetting, sidenotes and lines numbers can be, or not, in page margins. 
+In parallel typesetting, sidenotes and lines numbers can be, or not, in page margins.
 
 Normally, we get:
 
@@ -46,25 +46,25 @@ The only possible exceptions occur when the user makes mistakes when fixing $L$
 \section{Parameters}
 The  parameters that can be controlled by \package{reledmac} are (see fig.~\ref{pic:page}):
 
-\begin{description}	
+\begin{description}
 	\item[N] The numbered text width, \emph{i. e.} the width of text which is between \verb+\beginnumbering+ and \verb+\endnumbering+ in normal tyepsetting. By default $N=T$, but can be also modified by the \package{reledmac}/\package{reledpar} option \verb!widthliketwocolumns!: in this case, $N=L+B+S+A+R$
-	
+
 	\item[L] \verb!\Lcolwidth!; fixed width, by default \verb!{0.45\textwidth}!
-	
+
 	\item[R] \verb!\Rcolwidth!; fixed width, by default \verb!{0.45\textwidth}!
-	
+
 	\item[S] \verb!\columnseparator!; \package{reledpar} inserts a vertical rule of width \verb!\columnrulewidth!, by default set to be $0\,pt$. You can redefine \verb!\columnrulewidth! by
-	
+
 \begin{verbatim}
 	\setlength{\columnrulewidth}{0.4pt}
 \end{verbatim}
-	
+
 	\item[B] \verb!\beforecolumnseparator!: automatically calculated, but can be redefined by
-	
+
 \begin{verbatim}
 	\setlength{\beforecolumnseparator}{<length>}
 \end{verbatim}
-	
+
 	\item[A] \verb!\aftercolumnseparator!: automatically calculated, but can be redefined by
 
 \begin{verbatim}
@@ -87,7 +87,7 @@ In this case $LM$ and $RM$ are modified:
 \end{itemize}
 
 \section{Automatically calculated parameters}
-Therefore, the lengths automatically calculated are $LM$, $RM$, and, if not fixed by user, $B$ and $A$. 
+Therefore, the lengths automatically calculated are $LM$, $RM$, and, if not fixed by user, $B$ and $A$.
 
 
 \subsection{If $LM$, $RM$, $B$ and $A$ are calculated}
-- 
cgit v1.2.3

