From e0c6872cf40896c7be36b11dcc744620f10adf1d Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Mon, 2 Sep 2019 13:46:59 +0900
Subject: Initial commit

---
 macros/latex/contrib/elbioimp/test1.tex | 113 ++++++++++++++++++++++++++++++++
 1 file changed, 113 insertions(+)
 create mode 100644 macros/latex/contrib/elbioimp/test1.tex

(limited to 'macros/latex/contrib/elbioimp/test1.tex')

diff --git a/macros/latex/contrib/elbioimp/test1.tex b/macros/latex/contrib/elbioimp/test1.tex
new file mode 100644
index 0000000000..93d913aba1
--- /dev/null
+++ b/macros/latex/contrib/elbioimp/test1.tex
@@ -0,0 +1,113 @@
+\documentclass{elbioimp}
+\usepackage[latin1]{inputenc}
+\usepackage[T1]{fontenc}
+\usepackage[USenglish]{babel}
+\usepackage{textcomp,graphicx}
+\usepackage{lipsum}  %% For generating random text
+
+\title{This is your template for Journal of Electrical Bioimpedance}
+
+\author{First B. Author\affiliation{Department, University, City, Country}\and
+  Second C. Coauthor\sameaffiliation\and
+  Third D. Coauthor\affiliation{Xyz company}\and
+  Fourth E. Coauthor\sameaffiliation[1]\and
+  Last Z. Author\affiliation{E-mail any correspondence to:
+    \textsf{myname@domain.com}}}
+
+\keywords{Bioimpedance, current, voltage}
+
+\hyphenation{bio-impe-dance}
+
+\begin{document}
+\maketitle
+
+\begin{abstract}
+  These are guidelines for preparing papers for the Journal of
+  Electrical Bioimpedance. The journal accepts original research
+  papers and review articles within the broad field of electrical
+  bioimpedance. Use this document as a template if you are using
+  \LaTeX. The paper size is A4 (21\,\texttimes\,29.7\,cm).
+\end{abstract}
+
+
+\section{Introduction}
+This original source of this document is a template for Microsoft Word.
+Please use the electronic version of this document as a
+template when you produce your manuscript for submission to the
+\emph{Journal of Electrical Bioimpedance}. The paper size is standard A4
+(21\,\texttimes\,29.7\,cm).  
+
+The introduction section of your paper should include the necessary
+background information, including an adequate review of earlier
+findings and the justification for conducting this study.
+
+
+\subsection{Materials and methods}
+The margins in this document are set to 2.5\,cm for the top and 1.5\,cm
+for the sides and bottom. The main body of the manuscript is in two
+columns separated by a 1\,cm. The line spacing is 1.1.
+
+In the materials and methods section, please describe all necessary
+details on how the study was performed. Do not include any discussions
+of the work in this section. Enough information should be given so
+that other researchers can reproduce your study.
+
+
+\subsection{Results}
+All figures should be numbered consecutively with the figure legend
+indented 0.5 cm on each side.\footnote{See figure~\ref{fig:demo} for
+  an example.} 
+
+Figures may be in color or black and white and must be of such quality
+that they produce clear and sharp printouts on an ordinary (color)
+laser printer.
+
+Use this section to present the results from the measurements or
+studies that were described in the last section, but without going
+into any discussion about the results.
+
+\begin{figure}
+  \centering
+  \includegraphics[width=0.8\columnwidth]{test-ill}
+  \caption{Box-plot showing the median value (line), mean value (cross),
+    middle 50\% (box) and smallest and largest point within
+    1.5\,interquartiles from the box (whiskers) of all measurements on
+    days A, B and C.\label{fig:demo}}
+\end{figure}
+
+\begin{table}
+  \centering
+  \renewcommand{\arraystretch}{1.2}
+  \begin{tabular}{clccc}
+    $D$& &$P_u$& $\sigma_N$\\
+    (in)& & (lbs)& (psi)\\  \hline
+     5& test 1& 285& 38.00\\
+      & test 2& 287& 38.27\\
+      & test 3& 230& 30.67\\  \hline
+    10& test 1& 430& 28.67\\
+      & test 2& 433& 28.87\\
+      & test 3& 431& 28.73\\  \hline
+    \end{tabular}
+  \caption{A simple table\label{tab:demo}}
+\end{table}
+
+\subsection{Concluding text}
+\lipsum[1-9]
+
+\subsubsection{Additional comments}
+\lipsum[10-11]
+
+
+\section{Discussion}
+Now you can discuss your results. Emphasize the new and important
+aspects of the study and the conclusions that follow from them. Do not
+repeat in detail data or other information given in the Introduction
+or the Results section. After this section there may be sections
+called Conclusion and Acknowledgments. The last section is
+References. The \emph{Journal of Electrical Bioimpedance} uses the
+Vancouver style of references with numbers in square brackets in the
+text and a numbered list in the Reference section~\cite{NIH}.
+
+\nocite{Halpern,Meltzer,Murray,Rose}
+\bibliography{test-bib}
+\end{document}
-- 
cgit v1.2.3

