From e7ce6275948b3b197682f44f64fdb1daf672109c Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Thu, 16 Sep 2021 03:00:49 +0000
Subject: CTAN sync 202109160300

---
 macros/generic/unicode-data/load-unicode-data.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'macros/generic/unicode-data/load-unicode-data.tex')

diff --git a/macros/generic/unicode-data/load-unicode-data.tex b/macros/generic/unicode-data/load-unicode-data.tex
index abdc6a034b..f35a9a99c2 100644
--- a/macros/generic/unicode-data/load-unicode-data.tex
+++ b/macros/generic/unicode-data/load-unicode-data.tex
@@ -57,7 +57,7 @@
   \catcode`\^=7 %
   \newlinechar=`\^^J %
   \message{^^J}%
-  \message{load-unicode-data.tex v1.14 (2020-10-24)^^J}%
+  \message{load-unicode-data.tex v1.15 (2021-09-15)^^J}%
   \message{Reading Unicode data^^J}%
 % The first stage of parsing is dealing with the fact that there are lots of
 % data items separated by |;|. Of those, only a few are needed so they are
@@ -177,15 +177,15 @@
 % There is no version data in |UnicodeData.txt|: log that it is being used with
 % a hard-coded date (the modification date from ftp.unicode.org). This obviously
 % needs to be updated when a new download takes place!
-  \message{\string# UnicodeData-13.0.0.txt^^J}%
-  \message{\string# Modified 2020-03-12 11:00:00 GMT [JAW]^^J}%
+  \message{\string# UnicodeData-14.0.0.txt^^J}%
+  \message{\string# Modified 2021-09-15 11:00:00 GMT [JAW]^^J}%
 % Actually loading the file requires an input stream, done directly.
 % There is a blank line at the end of the data source so there is a check
 % here for a |\par|.
   \def\storedpar{\par}%
   \openin0=UnicodeData.txt %
   \loop\unless\ifeof0 %
-    \read0 to \unicodedataline  
+    \read0 to \unicodedataline
     \unless\ifx\unicodedataline\storedpar
       \expandafter\parseunicodedataI\unicodedataline\relax
     \fi
-- 
cgit v1.2.3

