From e0c6872cf40896c7be36b11dcc744620f10adf1d Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Mon, 2 Sep 2019 13:46:59 +0900
Subject: Initial commit

---
 info/examples/PSTricks_en/24-04-5.ltx | 29 +++++++++++++++++++++++++++++
 1 file changed, 29 insertions(+)
 create mode 100644 info/examples/PSTricks_en/24-04-5.ltx

(limited to 'info/examples/PSTricks_en/24-04-5.ltx')

diff --git a/info/examples/PSTricks_en/24-04-5.ltx b/info/examples/PSTricks_en/24-04-5.ltx
new file mode 100644
index 0000000000..60ef2dbec1
--- /dev/null
+++ b/info/examples/PSTricks_en/24-04-5.ltx
@@ -0,0 +1,29 @@
+%% 
+%%  A DANTE-Edition example
+%% 
+%%  Example 24-04-5 on page 458.
+%% 
+%%  Copyright (C) 2011 Herbert Voss
+%% 
+%%  It may be distributed and/or modified under the conditions
+%%  of the LaTeX Project Public License, either version 1.3
+%%  of this license or (at your option) any later version.
+%% 
+%%  See http://www.latex-project.org/lppl.txt for details.
+%% 
+%% 
+%% ==== 
+% Show page(s) 1
+%% 
+\documentclass[]{article}
+\pagestyle{empty}
+\setlength\textwidth{201.70511pt}
+\setlength\parindent{0pt}
+
+\usepackage{pstricks,pst-circ}
+
+\begin{document}
+\begin{pspicture}(-1,0)(3,2.5)
+  \logic[logicType=or,logicShowNode]{OR1}
+\end{pspicture}
+\end{document}
-- 
cgit v1.2.3

