From e0c6872cf40896c7be36b11dcc744620f10adf1d Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Mon, 2 Sep 2019 13:46:59 +0900
Subject: Initial commit

---
 .../contrib/circuitikz/tex/ctikzstyle-legacy.tex   | 136 +++++++++++++++++++++
 1 file changed, 136 insertions(+)
 create mode 100644 graphics/pgf/contrib/circuitikz/tex/ctikzstyle-legacy.tex

(limited to 'graphics/pgf/contrib/circuitikz/tex/ctikzstyle-legacy.tex')

diff --git a/graphics/pgf/contrib/circuitikz/tex/ctikzstyle-legacy.tex b/graphics/pgf/contrib/circuitikz/tex/ctikzstyle-legacy.tex
new file mode 100644
index 0000000000..2e33283dc4
--- /dev/null
+++ b/graphics/pgf/contrib/circuitikz/tex/ctikzstyle-legacy.tex
@@ -0,0 +1,136 @@
+% legacy style for circuits --- useful as a base for designing your style
+% Do not use LaTeX commands if you want it to be compatible with ConTeXt
+% Do not add spurious spaces
+%
+\tikzset{legacy circuit style/.style={\circuitikzbasekey/.cd,%
+% Resistors
+resistors/scale=1.0,
+resistors/width=0.8,
+resistors/zigs=3,
+resistors/fill=none,
+resistors/thickness=none,
+%
+% Capacitors
+capacitors/scale=1.0,
+capacitors/fill=none,
+capacitors/thickness=none,
+%
+% Inductors (and transformers)
+inductors/scale=1.0,
+inductors/fill=none,
+inductors/thickness=none,
+% these two are not set because the default is different in american and cute coils
+% inductors/width=0.6, % it's 0.8 for american coils
+% inductors/coils=5, % it's 4 for american coils
+%
+% Diodes
+diodes/scale=1.0,
+diodes/fill=none,
+diodes/thickness=none,
+%
+% Batteries
+batteries/scale=1.0,
+batteries/fill=none,
+batteries/thickness=none,
+%
+% Independent sources (the round ones)
+sources/scale=1.0,
+sources/fill=none,
+sources/thickness=none,
+% Dependent sources (the diamond-shaped ones)
+csources/scale=1.0,
+csources/fill=none,
+csources/thickness=none,
+%
+% Instruments
+instruments/scale=1.0,
+instruments/fill=none,
+instruments/thickness=none,
+%
+% Mechanical analogy
+mechanicals/scale=1.0,
+mechanicals/fill=none,
+mechanicals/thickness=none,
+%
+% Misc component (look at the manual)
+misc/scale=1.0,
+misc/fill=none,
+misc/thickness=none,
+%
+% Block diagrams
+blocks/scale=1.0,
+blocks/fill=none,
+blocks/thickness=none,
+%
+% Ground symbols
+grounds/scale=1.0,
+grounds/fill=none,
+grounds/thickness=none,
+%
+% Power supplies (but look at the manual, you can do more)
+power supplies/scale=1.0,
+power supplies/fill=none,
+power supplies/thickness=none,
+%
+% Transistors
+transistors/scale=1.0,
+transistors/fill=none,
+transistors/thickness=none,
+tripoles/mos style=no arrows,  % it can be "arrows"
+tripoles/pmos style=fullcircle, % it can be "fullcircle", "nocircle"
+transistors/arrow pos=legacy, % it can be "end"
+%
+% Vacuum tubes
+tubes/scale=1.0,
+tubes/fill=none,
+tubes/thickness=none,
+%
+% RF components
+RF/scale=1.0,
+RF/fill=none,
+RF/thickness=none,
+%
+% Electromechanical
+electromechanicals/scale=1.0,
+electromechanicals/fill=none,
+electromechanicals/thickness=none,
+%
+% Amplifiers
+amplifiers/scale=1.0,
+amplifiers/fill=none,
+amplifiers/thickness=none,
+%
+% Switches (they're a bit special, look the manual)
+switches/scale=1.0,
+switches/fill=none,
+switches/thickness=none,
+%
+% Logic ports
+logic ports/scale=1.0,
+logic ports/fill=none,
+logic ports/thickness=none,
+logic ports origin=legacy, % it can be "center" (better)
+%
+% Integrated circuits
+chips/scale=1.0,
+chips/fill=none,
+chips/thickness=none,
+%
+% Displays
+displays/scale=1.0,
+displays/fill=none,
+displays/thickness=none,
+%
+% Nodes width (connectors, etc
+nodes width=.04,
+%
+% Arrows size
+current arrow scale=16,
+},% end .style
+}% end \tikzset
+% You can add more commands here
+% Do not use LaTeX commands if you want it to be compatible with ConTeXt
+% Do not add spurious spaces
+%
+\endinput
+
-- 
cgit v1.2.3

