From b27d5ecc7cba92635475b78660b083793d93a3e7 Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Mon, 1 Nov 2021 03:02:12 +0000
Subject: CTAN sync 202111010302

---
 graphics/pgf/contrib/circuitikz/doc/changelog.tex | 24 +++++++++++++++++++++++
 1 file changed, 24 insertions(+)

(limited to 'graphics/pgf/contrib/circuitikz/doc/changelog.tex')

diff --git a/graphics/pgf/contrib/circuitikz/doc/changelog.tex b/graphics/pgf/contrib/circuitikz/doc/changelog.tex
index 0ce9902781..b715c12dc0 100644
--- a/graphics/pgf/contrib/circuitikz/doc/changelog.tex
+++ b/graphics/pgf/contrib/circuitikz/doc/changelog.tex
@@ -4,6 +4,30 @@ here. See \url{https://github.com/circuitikz/circuitikz/commits} for a
 full list of changes.
 
 \begin{itemize}
+\item
+  Version 1.4.4 (2021-10-31)
+
+  Normal maintenance release; minor bugs fixed, a new component and a
+  new option. No Halloween component, sorry\ldots{}
+
+  \begin{itemize}
+  \tightlist
+  \item
+    Added a laser diode component
+    (\href{https://github.com/circuitikz/circuitikz/issues/591}{contributed
+    by André Alves})
+  \item
+    Add the \texttt{override\ source\ vif} option and better describe
+    source's voltage positioning in the manual
+  \item
+    fix \texttt{nobase} option with IGBT family (noticed by
+    \href{https://tex.stackexchange.com/q/619334/38080}{user hinata exc
+    on Stack Eschange})
+  \item
+    fix a problem with
+    \href{https://github.com/circuitikz/circuitikz/issues/584}{legacy
+    open voltage label position}
+  \end{itemize}
 \item
   Version 1.4.3 (2021-09-06)
 
-- 
cgit v1.2.3

