From 20788e2817af7ef0b25395c161b06e7a1446b8b1 Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Wed, 21 Apr 2021 03:01:10 +0000
Subject: CTAN sync 202104210301

---
 graphics/pgf/contrib/circuitikz/doc/changelog.tex | 39 +++++++++++++++++++++++
 1 file changed, 39 insertions(+)

(limited to 'graphics/pgf/contrib/circuitikz/doc/changelog.tex')

diff --git a/graphics/pgf/contrib/circuitikz/doc/changelog.tex b/graphics/pgf/contrib/circuitikz/doc/changelog.tex
index 88bbe4d435..2cdfeeb95f 100644
--- a/graphics/pgf/contrib/circuitikz/doc/changelog.tex
+++ b/graphics/pgf/contrib/circuitikz/doc/changelog.tex
@@ -4,6 +4,42 @@ here. See \url{https://github.com/circuitikz/circuitikz/commits} for a
 full list of changes.
 
 \begin{itemize}
+\item
+  Version 1.3.4 (2021-04-20)
+
+  New things, like configurable modifier thickness, ferroelectric
+  devices, and several transistor tweaks. Importantly, a bug that
+  hindered compatibility with the internal Ti\emph{k}Z \texttt{circuits}
+  library (introduced in 1.3.3) has been fixed.
+
+  \begin{itemize}
+  \tightlist
+  \item
+    Added separate configuration for the line thickness of resistors,
+    capacitors, and inductors modifiers
+  \item
+    Added ferroelectric capacitors and ferroelectric gate MOS/FETs
+    (suggested by Mayeul Cantan,
+    https://github.com/circuitikz/circuitikz/issues/515)
+  \item
+    Added an option to fill the gate gap in MOSes, FETs and IGBTs with a
+    color
+  \item
+    Added a ``centergap'' anchor for transistors
+  \item
+    Added the option ``nogate'' to the \texttt{hemt} symbol
+  \item
+    Fixed a bug in thermistors not respecting their class line thickness
+  \item
+    Fixes in the manual (copy and paste of snippets without numbers,
+    correct old usage of \texttt{siunitx}, factor out repetitions in the
+    preamble; thanks to Ulrike Fischer:
+    https://tex.stackexchange.com/a/57160/38080)
+  \item
+    Fixed a bug introduced in 1.3.3 that would reduce compatibility with
+    the \texttt{circuits} internal library; reported by JetherReis
+    (https://github.com/circuitikz/circuitikz/issues/519)
+  \end{itemize}
 \item
   Version 1.3.3 (2021-04-04)
 
@@ -11,6 +47,9 @@ full list of changes.
   could change the look of your circuit (without affecting correctness).
   Some of the arrow shapes are now configurable.
 
+  Do not use this version, there is a bug with the new ``label
+  distance'' key.
+
   \begin{itemize}
   \tightlist
   \item
-- 
cgit v1.2.3

