From d043a18e288914d3c46a1b10af1f30ce2df00588 Mon Sep 17 00:00:00 2001
From: Norbert Preining <norbert@preining.info>
Date: Tue, 29 Sep 2020 03:02:54 +0000
Subject: CTAN sync 202009290302

---
 graphics/pgf/base/doc/text-en/pgfmanual-en-base-decorations.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'graphics/pgf/base/doc/text-en/pgfmanual-en-base-decorations.tex')

diff --git a/graphics/pgf/base/doc/text-en/pgfmanual-en-base-decorations.tex b/graphics/pgf/base/doc/text-en/pgfmanual-en-base-decorations.tex
index 68a1e2097c..50d4c370fe 100644
--- a/graphics/pgf/base/doc/text-en/pgfmanual-en-base-decorations.tex
+++ b/graphics/pgf/base/doc/text-en/pgfmanual-en-base-decorations.tex
@@ -1,4 +1,4 @@
-% Copyright 2008 by Till Tantau and Mark Wibrow
+% Copyright 2019 by Till Tantau and Mark Wibrow
 %
 % This file may be distributed and/or modified
 %
@@ -334,8 +334,8 @@ command describes the decoration automaton.
             First, this option causes an immediate switch to the state |final|
             if the remaining distance on the input path is less than
             \meta{dimension}. The effect is the same as if you had said 
-            |switch if less than=|\meta{dimension}| to final| just before the |width|
-            option.
+            |switch if less than=|\meta{dimension}| to final| just before the
+            |width| option.
 
             If no switch occurs, this option tells \pgfname\ the width of the
             segment. The current point will travel along the input path (as
@@ -599,7 +599,7 @@ Once a decoration has been declared, it can be used.
             point.
     \end{itemize}
 
-    Before the automata start to "work on" their respective inputs paths,
+    Before the automata start to ``work on'' their respective inputs paths,
     \meta{before code} is executed. After the decoration automaton has
     finished, \meta{after code} is executed.
     %
-- 
cgit v1.2.3

